Entries 1673 Mean 0.2669 RMS 0.3367 Underflow 0 Overflow 0

bcl 0 0.2 0.4 0.6 0.8 1 0

200

400

600 bcl {ixy==0}^{Entries 2629}_{Mean 0.946}

RMS 0.1126 Underflow 0 Overflow 0

bcl 0 0.5 1 0

500

1000

Entries 2629 Mean 0.946

bcl {ixy==1}

xy -10 0 10 bcl

0

0.2

0.4

0.6

0.8

1 bcl:xy {ixy==0}

xy -20 0 20 bcl

0

0.5

1 bcl:xy {ixy==1}

04/25/2006 09:24

Files for all.

-0.5 0 0.5 -40

-20

0

20 Fitted Set X Position vs H, Y=0 mm

-1 -0.5 0 0.5 1

-2

0

2 X Residual vs H, Y=0 mm

-1 -0.5 0 0.5 1

-2

0

2 X Residual vs H, Y=15 mm

04/25/2006 09:24

Files for all.

-0.5 0 0.5

-20

0

20

40 Y= 0 mm Y= 5 mm Y=10 mm

X vs Difference over Sum

-0.5 0 0.5

-5

0

5 (Y= 0 mm) - ( Y= 5 mm) (Y=10 mm) - ( Y= 5 mm)

Fitted Set X Position vs H, Y=10 mm

04/25/2006 09:24

Files for all.