-0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0 20 40 60 80 100 120 140 160 htemp Nent = 728 Mean = 4.493e-05 RMS = 0.007383

res5 {abs(res5)<0.1&&nhits5>0&&station==1} htemp