Terabyte Track results — Hummingbird

Summary Statistics Run ID humT04 Run Type automatic Fields Used title Run Description NoLinksUsed-NoAnchorTextUsed- DocStructUsed Time to index 6000 min. Time to retrieve top 20 per query 50 sec. System RAM 0.5 GB Size of on-disk structures 120 GB Approx system cost $5000 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 5668

Recall Level Averages Recall Precision 0.00 0.7092 0.10 0.4355 0.20 0.3588 0.30 0.3006 0.40 0.2478 0.50 0.1899 0.60 0.1099 0.70 0.0482 0.80 0.0105 0.90 0.0051 1.00 0.0000 Mean average precision non-interpolated 0.1963

Document Level Averages Precision At 5 docs 0.4939 At 10 docs 0.4612 At 15 docs 0.4544 At 20 docs 0.4459 At 30 docs 0.4388 At 100 docs 0.3455 At 200 docs 0.2705 At 500 docs 0.1774 At 1000 docs 0.1157 R-Precision: precision after R (number relevant) documents retrieved Exact 0.2690

Terabyte Track results — Hummingbird

Summary Statistics Run ID humT04l Run Type automatic Fields Used title Run Description NoLinksUsed-NoAnchorTextUsed- DocStructUsed Time to index 6000 min. Time to retrieve top 20 per query 115 sec. System RAM 0.5 GB Size of on-disk structures 120 GB Approx system cost $5000 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 6056

Recall Level Averages Recall Precision 0.00 0.7460 0.10 0.4838 0.20 0.4020 0.30 0.3409 0.40 0.2859 0.50 0.2185 0.60 0.1430 0.70 0.0776 0.80 0.0228 0.90 0.0075 1.00 0.0000 Mean average precision non-interpolated 0.2238

Document Level Averages Precision At 5 docs 0.5265 At 10 docs 0.4878 At 15 docs 0.4830 At 20 docs 0.4684 At 30 docs 0.4524 At 100 docs 0.3827 At 200 docs 0.2952 At 500 docs 0.1916 At 1000 docs 0.1236 R-Precision: precision after R (number relevant) documents retrieved Exact 0.2943

Terabyte Track results — Hummingbird

Summary Statistics Run ID humT04vl Run Type automatic Fields Used title Run Description NoLinksUsed-NoAnchorTextUsed- DocStructUsed Time to index 6000 min. Time to retrieve top 20 per query 119 sec. System RAM 0.5 GB Size of on-disk structures 120 GB Approx system cost $5000 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 6087

Recall Level Averages Recall Precision 0.00 0.7402 0.10 0.4688 0.20 0.4087 0.30 0.3374 0.40 0.2806 0.50 0.2219 0.60 0.1440 0.70 0.0797 0.80 0.0179 0.90 0.0075 1.00 0.0000 Mean average precision non-interpolated 0.2209

Document Level Averages Precision At 5 docs 0.4776 At 10 docs 0.4612 At 15 docs 0.4694 At 20 docs 0.4673 At 30 docs 0.4497 At 100 docs 0.3808 At 200 docs 0.2962 At 500 docs 0.1919 At 1000 docs 0.1242 R-Precision: precision after R (number relevant) documents retrieved Exact 0.2933

Terabyte Track results — Hummingbird

Summary Statistics Run ID humT04dvl Run Type automatic Fields Used title Run Description NoLinksUsed-NoAnchorTextUsed- DocStructUsed Time to index 6000 min. Time to retrieve top 20 per query 142 sec. System RAM 0.5 GB Size of on-disk structures 120 GB Approx system cost $5000 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 6005

Recall Level Averages Recall Precision 0.00 0.7010 0.10 0.4549 0.20 0.3911 0.30 0.3267 0.40 0.2727 0.50 0.2148 0.60 0.1330 0.70 0.0709 0.80 0.0171 0.90 0.0094 1.00 0.0000 Mean average precision non-interpolated 0.2116

Document Level Averages Precision At 5 docs 0.4408 At 10 docs 0.4388 At 15 docs 0.4231 At 20 docs 0.4235 At 30 docs 0.4204 At 100 docs 0.3751 At 200 docs 0.2915 At 500 docs 0.1899 At 1000 docs 0.1226 R-Precision: precision after R (number relevant) documents retrieved Exact 0.2887

Terabyte Track results — Hummingbird

Summary Statistics Run ID humT04l3 Run Type automatic Fields Used title Run Description NoLinksUsed-NoAnchorTextUsed- DocStructUsed Time to index 6000 min. Time to retrieve top 20 per query 49 sec. System RAM 0.5 GB Size of on-disk structures 120 GB Approx system cost $5000 Number of Topics: 49 Total number of documents over all topics Retrieved: 49000 Relevant: 10617 Rel-ret: 5272

Recall Level Averages Recall Precision 0.00 0.6154 0.10 0.3488 0.20 0.2873 0.30 0.2384 0.40 0.1979 0.50 0.1450 0.60 0.0877 0.70 0.0478 0.80 0.0148 0.90 0.0040 1.00 0.0000 Mean average precision non-interpolated 0.1548

Document Level Averages Precision At 5 docs 0.4041 At 10 docs 0.3755 At 15 docs 0.3619 At 20 docs 0.3490 At 30 docs 0.3435 At 100 docs 0.2731 At 200 docs 0.2318 At 500 docs 0.1587 At 1000 docs 0.1076 R-Precision: precision after R (number relevant) documents retrieved Exact 0.2297