TrigMon #181 XTCDMonitor 1.5.4: Xtc Slots Efficiency

Run:244186 Event: 3390100 # of Events:5850 Time: Tue Jun 26 03:44:59 2007

Entries 45

0

0.2

0.4

0.6

0.8

1 683 events

XTCDMonitor Xtc Hit Efficiency Slots for Crates 0 Through 4 Ref

COT 00

2 3 4 11 12 13

COT 01

2 3 4 5 6 7 8 13 14 15

COT 02

2 3 4 5 6 7 12 13 14

COT 03

9 10 11 16 17 18 19 20 21

COT 04

8 9 10 15 16 17 18 19 20 21

XTCDMonitorXtcHitEfficiencySlots5Through9Ref Entries 41 Mean 19.5 RMS 11.54

0

0.2

0.4

0.6

0.8

1 683 events

XTCDMonitor Xtc Hit Efficiency Slots for Crates 5 Through 9 Ref

COT 05

10 11 12 19 20 21

COT 06

9 10 11 17 18 19 20 21

COT 07

8 9 10 16 17 18 19 20 21

COT 08

2 3 4 5 6 7 13 14 15

COT 09

2 3 4 5 6 12 13 14

Entries 43

0

0.2

0.4

0.6

0.8

1 683 events

XTCDMonitor Xtc Hit Efficiency Slots for Crates 10 Through 19 Ref

COT 10

12 13 14

COT 11

9 10 11 12 13

COT 12

9 10 11 12 13

COT 13

10 11 12 13 14

COT 14

10 11 12 13 14

COT 15

9 10 11

COT 16

9 10 11

COT 17

9 10 11 12 13

COT 18

10 11 12 13 14

COT 19

12 13 14