Max. Energy Deposition (GeV)

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0 5 10 15 20 25 30 35 htemp Nent = 667 Mean = 0.1758 RMS = 0.03607

0.2 GeV Single Electrons^{htemp}_{Nent = 667}

4 by 4 overlapping

2 by 2 non overlapping

12 by 2 non overlapping

Max. Energy Deposition (GeV)

0 0.1 0.2 0.3 0.4 0.5 0.6 0

10

20

30

40

50 htemp Nent = 681 Mean = 0.2717 RMS = 0.05105

0.3 GeV Single Electrons_{htemp}

Max. Energy Deposition (GeV)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0

10

20

30

40

50 htemp Nent = 730 Mean = 0.4646 RMS = 0.06906

0.5 GeV Single Electrons _{htemp}

Max. Energy Deposition (GeV)

0 0.2 0.4 0.6 0.8 1 0

10

20

30

40

50

60 htemp Nent = 737 Mean = 0.6563 RMS = 0.08103

0.7 GeV Single Electrons_{htemp}