ObjectMon #2 TimeMonitor HADTDC Timing

Run:163390 Event: 222552 # of Events:4149 Time: Fri May 23 19:23:16 2003

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 22678

CHA: Eff. KS=0.94 (>0.01)

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

Entries 25497 Mean 566.9 RMS 7.02

CHA: Raw Time /ndf= 2.5 (<15) 2χ GOOD

Nent = 25497 0.05 ± Mean = 567 0.05 ± RMS = 6.8

Width [ns]

50 52 54 56 58 60 62

Events

0 500 1000

1500

2000

2500

3000

3500

4000

Entries 25497 Mean 55.55 RMS 2.342

CHA: Hit Width

/ndf= 2.3 (<15) 2χ GOOD

Nent = 25497 0.02 ± Mean = 56 0.01 ± RMS = 2.3

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 20853

PHA: Eff.

KS=0.015 (>0.01)

GOOD

raw time [ns]

540 550 560 570 580

Events

0 200 400 600 800 1000

1200

Entries 26882 Mean 558.7 RMS 8.151

PHA: Raw Time /ndf= 62 (>15) 2χ BAD

Nent = 26882 0.06 ± Mean = 559 0.05 ± RMS = 8.4

Width [ns]

50 55 60 65

Events

0 500 1000

1500

2000

2500

3000

3500

4000

Entries 26882 Mean 57.28 RMS 2.748

PHA: Hit Width

/ndf= 2.4 (<15) 2χ GOOD

Nent = 26882 0.02 ± Mean = 57 0.02 ± RMS = 2.5

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 7477

WHA: Eff. KS= 1 (>0.01)

GOOD

raw time [ns]

550 560 570 580

Events

0 50 100 150 200 250 300 350 400

Entries 8631 Mean 564.5 RMS 7.918

WHA: Raw Time /ndf= 1.3 (<15) 2χ GOOD

Nent = 8631 0.1 ± Mean = 564 0.08 ± RMS = 7.4

Width [ns]

50 55 60

Events

0 200 400 600 800 1000

Entries 8631 Mean 54.2 RMS 2.795

WHA: Hit Width

/ndf=0.89 (<15) 2χ GOOD

Nent = 8631 0.03 ± Mean = 54 0.03 ± RMS = 2.6