94 245Pu

D: 63098 14 S_n: 4773 13 S_p: (7400) Q_{b--} : 1205 15 Q_a: (4500) s_g: 150 30 b Nuclear Bands A 9/2[734] B 1/2[620] C 7/2[613] D 3/2[622] E 1/2[761]? F Fission isomer Levels:

A 0, (9/2^- ), 10.5 1 h, %b^- =100 A 217, (15/2^- )

246 4 B 306 3, (1/2^+) C 325 2, (9/2^+) B 355 3, (5/2^+) B 423 5, (7/2^+) B 459 5, (9/2^+) D 575 4, (3/2^+) D 613 4, (5/2^+) E 637 4, (3/2^- ) D 660 3, (7/2^+) E 675 3, (7/2^- ) D 723 3, (9/2^+)

738 3 758 4 802 2 1071 3 1128 3 1279 3 1389 4 F 2000 400, 90 30 ns, %SF £100

245 94Pu 0 (9/2^–)

SF 2000

IT

10.5 h

90 ns