Survey Number: PM-009  
Format Acronymn: ARO8
NGDC File Number: 0140-009
Params: FXD  
Data Rec'd @NGDC (YYMMDD): 850000
Contributing Institution:                                         
Country:                   
Platform Name:                     
Code:  
Platform Type:       
Chief Scientist(s):                                
Project:                                                                               
Start Date (YYMMDD): 560924
Survey Departure Airport:                                  
End Date (YYMMDD): 700901
Survey Arrival Airport:                                
Flight Line Spacings:                                         
Magnetometor(s) Used:                                       
Aircraft Altitude:                     
Aircraft Velocity:               
Sampling Rates Per Second:    
Sensor Tow Distance:        
Reference Field:              
Total Observations:           
Magnetometor Sensitivity:            
Bounding Limits:
Top Latitude   : +52
Bottom Latitude: -18
Left Longitude : +145
Right Longitude: -103
                                                                             
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
