Energy (GeV)

0 1 2 3 4 5 6 7 8 9 10 counts

1

10

10^2

erth1 Nent = 1292 Mean = 1.491 RMS = 0.7228

Gamma 1 Monitor erth1

Energy (GeV)

0 2 4 6 8 10 12 14 counts

1

10

10^2

erth2 Nent = 599 Mean = 2.97 RMS = 1.75

Gamma 2 Monitor erth2

Energy (GeV)

0 1 2 3 4 5 6 7 counts

1

10

10^2

10^3

erth3 Nent = 8168 Mean = 0.8685 RMS = 0.2912

2x2 Monitor erth3

Ptot (GeV/c)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 counts

1

10 erth4 Nent = 35 Mean = 0.7686 RMS = 0.449

Electron Candidate Monitor erth4

Ptot (GeV/c)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 counts

1

erth5 Nent = 7 Mean = 0.4293 RMS = 0.1989

Phi Candidate Monitor erth5

Summary

Run Number : 40574

Estimate of actual G1 Cluster Events (E > 1.2 GeV): 0.64

Estimate of actual G2 Cluster Events (E > 2.0 GeV): 0.61

Estimate of actual 2x2 Cluster Events (E > 0.7 GeV): 0.74

Estimate of actual Electron Candidate Triggers: 0.71

Estimate of actual Phi Candidate Triggers: 0.27

Reference Levels : G1=0.63, G2=0.56, 2x2=0.75, EC=0.62, PhiC=0.07