Directory: /scratch/ambrose/asdqtest/nov09/

  S Q C phi slt rpt cr sl i tdcn
  - - --- --- --- --- -- -- - ----
  3 C 176 273 110 568 07 08 0 SWB2
  3 C 178 273 110 569 07 08 1 SWB2
  3 D 180 273 110 570 07 08 2 SWB2
  3 D 182 273 110 571 07 08 3 SWB2

DTH scan: 170-700 mV, 10 mV steps (54 points)

Ranges: TIM WID ATN QEN DTH OSC

  min: 434.7 30.0 18.2 22.3 490 190
  max: 442.9 35.8 24.1 26.9 550 480
  avg: 438.8 33.2 21.5 24.5 524 196

Cell summary:

  SL3-176 (C,568,07-08-0): OKAY
  SL3-177 (C,568,07-08-0): OKAY
  SL3-178 (C,569,07-08-1): OKAY
  SL3-179 (C,569,07-08-1): OKAY
  SL3-180 (D,570,07-08-2): OKAY
  SL3-181 (D,570,07-08-2): OKAY --> 1 TRK
  SL3-182 (D,571,07-08-3): OKAY
  SL3-183 (D,571,07-08-3): OKAY