Name:________________________________Guest #: ____________

HELP/QUESTIONS: Contact Angela Melocoton, x 5975, or e-mail at userscenter@bnl.gov.

Welcome to Brookhaven National Laboratory. All users of the AGS are required to check-in with

the individual experimental offices and obtain Radworker 1 and Collider-Accelerator Fixed-Target Users� Training. The Guest Orientation Form attached should be given to the safety personnel listed below. They will meet with you and do a job training assessment to determine if additional training is required. This sheet is designed to help you locate the people and training sites you have to visit. A building map can be found on the back of this page. A Brookhaven site map is also attached. Further safety information can be found at

http://ww.phy.bnl.gov/e949/safety/ or http://www.phy.bnl.gov/~safety/esh_home.html.

E949 Personnel Building # Room # Phone # Pager #*

Debbie Kerr (Administration) 510E 3-178 3857

AND Kelvin Li (Safety/Training) 510E 3-174 3828/4825

AND Mike Zarcone (Training Coordinator) 510A 1-43 5890 8502

RADIOLOGICAL WORKER 1 Alternate Tuesdays, 9:00, Bldg. 535 OR Challenge Exam** Schedules can be found at http://training.bnl.gov/Schedule/calendar.htm AND COLLIDER ACCELERATOR FIXED-TARGET USERS� TRAINING Course scheduled on demand OR Challenge Exam*** For course contact the C-A Training Coordinator John Maraviglia at 631-344-7343, maraviglia@bnl.gov, or pager # 4210

The Collider-Accelerator (C-A) Department is responsible for the safe operations of the RHIC & AGS rings and experiments. Further information about safety can be found http://www.agsrhichome.bnl.gov/AGS/Accel/SND/. Questions pertaining to environmental, health, training, or emergencies at the AGS should be directed to:

C-A Safety Personnel Building # Room # Phone # Pager #*

I-Hung Chiang (E949 Liaison Physicist) 911B A209 7903 4240

John Maraviglia (Training Coordinator) 911A A-120A 7343 4210

Main Control Room 911 4662

Asher Etkin (ES&H Coordinator) 911A A-135 7200/4006 5605

Lori Stiegler (ES&H Coordinator) 911A A-135 4617 6152

*Pager instructions: dial 3456 wait for tone, dial pager #, wait for tone, dial your phone #, hangup, and wait for reply. **Challenge exams for Radiological Worker 1 are available for individuals who have taken the course previously or who can demonstrate having successfully completed equivalent training elsewhere. Exams can be taken at the RHIC & AGS Users� Center, Physics Department room 1-43, or Collider-Accelerator Department room A-128. ***Challenge exams for Fixed-Target Users are available for individuals who have taken AGS Users or AGS Fixed- Target Users Training previously. Exams can be taken by contacting Ann Marie Luhrs at x7007, Bldg. 911 room A-128.

Guest Name: ID #:

Experiment: E949 BNL Supervisor: Steve Kettell

TYPE OF CHECK IN Req�d. NAMES OF REPRESENTATIVES

User Center Check In X Angela Melocoton or Susan White-DePace (Bldg. 355A, x5975) date Experimental Office Check In X Debbie Kerr (Bldg. 510E, Room 3-178, x3857) date

Department Training Coordinator X Mike Zarcone (Bldg. 510A, Room 1-43, x5890)

Christine Greenberg (Bldg. 510A, Room 1-41, x2585) date

Job Training Assessment

X

Kelvin Li (Bldg. 510E, Room 3-174, x3828/4825) date

E949 Group Safety Officer Joe Cracco (Bldg. 510E, Room 151, x3783, pager 8564) date

Department ES&H Coordinator Mike Zarcone (Bldg. 510A, Room 1-43, x5890) or

Ron Gill (Bldg. 510A, Room 1-171, x3987/3908) date

Facility Support Representative Joe Vignola (Bldg. 510A, Room 1-134, x3846) date

E949 Liaison Physicist I-Hung Chiang (Bldg. 911B, Room A209, x7903) date

OTHER^{date}

Class Date Completion Date

Radiological Worker 1 (RW1) RWT-002 Alt. Tues., Bldg. 535 OR Challenge

C-A Fixed Target Users Training (AD-User-FIXTRGT) ON DEMAND

Schedule through C-A Training

Coordinator OR Challenge

RAD Worker Reciprocity for DOE-trained Individuals Included in C-A Fixed TargetUser Training

General Employee Training � GET (HP-V001) Included in C-A Fixed TargetUser Training

Stop Work (GE-STOPWORK) Included in C-A Fixed TargetUser Training

Emergency Planning & Response for General Employees

(GE-EMERGPLAN) Included in C-A Fixed TargetUser Training

Oxygen Deficiency Hazard � ODHO (TQ-ODH) Included in C-A Fixed TargetUser Training

E949 Work Plan http://www.phy.bnl.gov/e949/safety

Cyber Security (GE-CYBERSEC) http://training.bnl.gov

Radiation ALARA (PO-RADALARA) Mike Zarcone, Bldg. 510A, Rm. 1-43

Hazard Communication (HAZCOMM HP-IND-200PO) http://training.bnl.gov

Environmental Protection Training (GE-ENV-GET) http://training.bnl.gov

Radiation Dosimetry required+ Yes X No Trainer initial concurrence of choice. __________ Account # to charge dosimetry to 08751

Additional Training Required (see back of page for courses) Yes No Trainer initial concurrence of choice. _________

+Radiation badges can be picked up at Collider-Accelerator Department, Bldg. 911, Room A-128 or Physics Department, Bldg. 510, Room 1-43.