0 50 100 150 200 250 0

200

400

600

800

1000

1200

Mass(L5 W IGV match)

mwigvm Entries 7409 Mean 77.84 RMS 23.12

0 50 100 150 200 250 300 350 400 0

200

400

600

800

1000

Mass(L5 hadtop IGV match)

mtopigvm Entries 7409 Mean 161.3 RMS 32.02

0 50 100 150 200 250 0

200

400

600

800

1000

W Mass(L5),IGVm chis<200

mwigv_c200 Entries 6004 Mean 75.82 RMS 13.86

0 50 100 150 200 250 300 350 400 0

200

400

600

800

1000

HTop Mass(L5),IGVm chis<200

mtopigv_c200 Entries 6004 Mean 159.6 RMS 20.81

0 50 100 150 200 250 0

10

20

30

40

50 W Mass(L5),IGVm, ISR match

mwigv_isr Entries 529 Mean 102.3 RMS 45.25

0 50 100 150 200 250 300 350 400 0

10

20

30

40

50 HTop Mass(L5),IGVm, ISR match

mtopigv_isr Entries 529 Mean 195.7 RMS 58.75