R249

R247

R250

R248

R246

R244

R242

R240

R245

R243

R241

R239

C314

C312

C313

R233

R232

R230

R231

R238

R234

R237

R236

C202

C204

C206

C208

C210

C194

C196

C188

C190

C192

C198

R235

C200

C304

C305

R186

C293

SP2SP1

R162

IC72

R155

C297

10UF

C298

R156

R157

D14R149

R150

D15D16

7715

TL

IC23

R24

R25

R148

R147

R146

C289

C290

C291

C288

R145

R142

IC62

C273

C275

C277

C279

C281

C283

C285

C287

C271

C265

C269

C267

CD4070BCM

IC49

22U

C250

C252

R131

C256

C255

C254

C253

C258

C257

C260

C259

C262

C263

C261

R133

R132

R134

R135

C251

R139

R136

R140

R137

R141

R138

R129

R104

C168

R105

C169

R106

C170

IC50

C197

C199

C201

C203

C205

C207

C209

C211

C195

C189

C193

C191

411CLC

IC66

IC63

IC65

C173

C176

R109

C180

C179

C178

C177

C182

C181

C184

C183

C186

C187

C185

R111

R110

R112

R113

C174

R117

R114

R118

R115

R119

R116

R120

IC64

IC67

R108

C172

C171

L6

R107

R143

IC56

C235

C237

C239

C241

C243

C245

C247

C249

C233

C227

C231

C229

C212

C214

R121

C218

C217

C216

C215

C220

C219

R86C160

R85C159

R87C161

R89C163

R90C164

R88

C162

R103

R102

C222

C221

C224

C225

C223

R123

R122

R144

C213

R127

R124

TL7705

IC25

R128

R125

R126

R130

L3

L5L4

L2R53R54R51R57R56

R55

R52R48

R49

R50R42

R41R40R44

R43R35R37

R36R34

R27R26R29R28R17R14

C292

R21

R13411CLC

IC51

IC53

IC54

IC52

IC55

IC57

IC59

C73C74

C77C76

C72C75C71C69C68C70C63

C61C64C59

C42C41C39C40

C52

C56C53

C78

C79

C62

C50

C5522UC54411CLC

IC60

R151

IC58

74HC85D

IC12

74AC16543DL

IC20

L179L05

LM

IC10

D2411CLC

IC61

C264

R272

C274

C272

C266

C286

C270

C268

C284

C282

C280

C278

C276

R273

R274

R275

R276

R277

R278

R279

R280

R281

R282

R283

R284

R285

R286

R287

R288

R289

R290

R291

R292

C318

C319

C320

R255

R253

R252

R251

C315

R256

C316

R257

R258

R259

R260

R261

R262

R263

R264

R265

C317

R266

R267

R268

R269

R270

R271

R254

C226

C228

C230

C232

C234

C236

C248

C246

C244

C242

C240

C238STUFF IT

16516516554.9

54.9

0.1uF

600600600100pF

100pF

4.99K

49.9

5959594.7uF

4.7uF

499499499499499499499499499499499499499499499499499499499499499499499499499499499150pF

150pF

453453453101010101010101010101010101010101010101010101010101010101010101010101010

1uF

EX8-H9E103J

1uF1K243332

1.21K

10010K10K4.7uF

6.7K

13.4K

5100.47uF

3.01K

3.01K

1uF5.1BLM21A102S

1uF5.1BLM21A102S

1uF49.9

1uF1uF

2727

1uF1uFBLM21A102S

BLM21A102S

8.44K

150LM337L

0.1uF

10BQ040

51.1K

51.1K

2001uF1uF1uF39.2K

5.15.1BLM21A102A

BLM21A102A

49.9

10K1000pF

100K

6.8K

OP-27

199199199BAVBAVBAV

0.01uF

BOTTOM SILK