0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

100

200

300

400

500 htemp Nent = 11782 Mean = 489 RMS = 335.1 peakadc {cluswid>1&&cluswid<5&&nclus==1&&iplane==1} htemp