ObjectMon #2 TimeMonitor HADTDC Timing

Run:175596 Event: 728030 # of Events:25323 Time: Fri Dec 5 02:59:34 2003 Ref.Run:175155

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 131402

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

7000

Entries 141516 Mean 566 RMS 7.044

CHA: Raw Time /ndf= 73 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

Entries 141516 Mean 55.49 RMS 2.546

CHA: Hit Width

/ndf= 21 (>15) 2χ BAD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 127114

PHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570

Events

0 2000

4000

6000

8000

10000

Entries 156525 Mean 560.6 RMS 6.049

PHA: Raw Time

/ndf=1.2e+02 (>15) 2χ BAD

Width [ns]

50 55 60 65

Events

0 5000

10000

15000

20000

25000

Entries 156525 Mean 57.25 RMS 2.727

PHA: Hit Width

/ndf= 5.1 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 45404 Mean 1.681 RMS 0.765

WHA: Eff. Eff. Check Ok GOOD

raw time [ns]

540 550 560 570 580

Events

0 500 1000

1500

2000

2500

Entries 52038 Mean 563.8 RMS 7.907

WHA: Raw Time /ndf= 16 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

6000

RawWidthWHA Entries 52038 Mean 54.28 RMS 2.921

WHA: Hit Width /ndf= 3.4 (<15) 2χ GOOD