rates

Entries 8 Mean 478 RMS 68.81 Underflow 0 Overflow 0

SQUID ECAL rates (KBytes/sec)

0 100 200 300 400 500 600 700 800 900 1000 0

0.5

1

1.5

2

2.5

3 SQUID ECAL rates