 Directory: /scratch/ambrose/asdqtest/oct27/

   S Q C phi slt rpt cr sl i tdcn
   - - --- --- --- --- -- -- - ----
   8 D 468 353 143 744 10 10 0 NET3
   8 D 470 353 143 745 10 10 1 NET3
   8 D 472 353 143 746 10 10 2 NET3
   8 D 474 353 143 747 10 10 3 NET3

 DTH scan: 170-700 mV, 10 mV steps (54 points)

 Ranges: TIM WID ATN QEN DTH OSC

   min: -1.0 -1.0 -1.0 -1.0 490 170
   max: 438.6 36.4 23.9 26.9 700 500
   avg: 433.1 33.1 20.8 24.1 534 205

 Cell summary:

   SL8-468 (D,744,10-10-0): OKAY
   SL8-469 (D,744,10-10-0): OKAY
   SL8-470 (D,745,10-10-1): OKAY
   SL8-471 (D,745,10-10-1): OKAY
   SL8-472 (D,746,10-10-2): OKAY
   SL8-473 (D,746,10-10-2): OKAY
   SL8-474 (D,747,10-10-3): OKAY
   SL8-475 (D,747,10-10-3): OKAY

Wire summary:

   SL8-471 (D,745,10-10-1): #08/44 N = 1.011 (1.000,0.000,0.018,0.984)
   SL8-473 (D,746,10-10-2): #07/67 N = 1.282 (1.603,0.000,0.000,0.812)
                                   W = 25.2 (32.9+/-4.5) -7.6
   SL8-474 (D,747,10-10-3): #11/83 N = 1.757 (1.921,0.000,0.000,0.889)
                                   W = 11.9 (32.9+/-4.5) -21.0
                                   A = 7.1 (20.8+/-4.5) -13.7
                                   Q = 8.7 (24.0+/-4.5) -15.3
   SL8-475 (D,747,10-10-3): #11/95 N = 0.000 (0.000,0.000,0.000,0.000)
                                   T = -1.0 (436.2+/-7.0) -437.2
                                   W = -1.0 (32.9+/-4.5) -33.9
                                   A = -1.0 (20.8+/-4.5) -21.8
                                   Q = -1.0 (24.0+/-4.5) -25.0
                                   D = 700 (533+/-70) +167