CDF II (2 fb^{−1}) Jet E^{corr.}_T [GeV] Observed Predicted Δ [%] 20-30 1892 1641 ± 29 -15.3 ± 3.3 30-45 1561 1693 ± 45 7.8 ± 3.4 45-65 701 768 ± 46 8.7 ± 6.4 65-90 464 462 ± 46 -0.5 ± 11.0 ≥90 466 466 ± 76 -0.1 ± 16.9 ≥20 5084 5029 ± 219 -1.1 ± 4.6