BRU145

Demag

Level

2 0

5 0

1 0 0

1 5 0

2 0 0

2 5 0

3 0 0

3 5 0

4 0 0

4 5 0

5 0 0

SNW Up

E Dn

Div.= 2.0e-6

1.05 0 0

Jo= 8.7e-6

447’11"

POD7

Demag

Level

2 0

5 0

1 0 0

1 5 0

2 0 0

2 5 0

3 0 0

3 5 0

4 0 0

4 5 0

5 0 0

5 5 0

6 0 0

SNW Up

E Dn

Div.= 2.0e-5

Jo= 1.4e-4

2 8 ’ 3 "

BRU108

51 0

1 5

2 5

3 0

4 0

6 0

Div.= 5.0e-5

1.05 0Jo= 6.9e-5

2 03 04 06 0324’9"