Appendix B

Color Correction Tables

Color correction factors, K, are given for a variety of assumed source spectral energy distributions in Tables B.0-1 to B.0-6. Null entries imply that K > 3. The correction factor should be divided into the quoted intensity to calculate an estimate of the actual intensity, as follows:

I_ν (actual) = I_ν (quoted)/K.

Equation (5.2) in §5.5 specifies how a color correction factor can be derived for an arbitrary source spectrum.

Table B.0-1: Color correction factors for power law spectra of the form I_ν ∝ ν^n n DIRBE band

1 2 3 4 5 6 7 8 9 10 -3.00 1.03 1.02 1.03 0.99 1.09 0.71 0.89 0.97 1.14 1.10 -2.50 1.02 1.01 1.02 1.00 1.05 0.76 0.91 0.97 1.10 1.06 -2.00 1.01 1.01 1.01 1.00 1.02 0.83 0.93 0.98 1.06 1.03 -1.50 1.01 1.00 1.00 1.00 1.01 0.91 0.96 0.99 1.03 1.01 -1.00 1.00 1.00 1.00 1.00 1.00 1.00 1.00 1.00 1.00 1.00 -0.50 1.00 1.00 1.00 1.00 1.00 1.10 1.05 1.02 0.98 0.99 0.00 0.99 0.99 1.00 1.01 1.02 1.23 1.10 1.04 0.97 0.99 0.50 0.99 0.99 1.00 1.01 1.04 1.37 1.17 1.07 0.96 1.00 1.00 0.99 0.99 1.00 1.01 1.08 1.53 1.25 1.11 0.95 1.01 1.50 0.99 0.99 1.00 1.02 1.13 1.72 1.34 1.15 0.95 1.03 2.00 0.99 0.99 1.01 1.02 1.19 1.95 1.46 1.20 0.96 1.06 2.50 1.00 0.99 1.02 1.03 1.27 2.21 1.59 1.26 0.96 1.09 3.00 1.00 0.99 1.03 1.03 1.36 2.52 1.75 1.33 0.98 1.13

113

Table B.0-2: Color correction factors for spectra of the form I_ν ∝ B_ν (T ) T DIRBE band (K) 1 2 3 4 5 6 7 8 9 10 10 – – – – – – – 1.35 1.61 1.01 12 – – – – – 1.38 2.25 1.14 1.31 0.97 14 – – – – – 0.76 1.57 1.03 1.17 0.96 16 – – – – – 0.53 1.25 0.98 1.09 0.96 18 – – – – – 0.42 1.07 0.95 1.04 0.96 20 – – – – – 0.36 0.96 0.94 1.01 0.96 22 – – – – – 0.33 0.90 0.93 0.99 0.97 24 – – – – – 0.31 0.86 0.93 0.97 0.97 26 – – – – – 0.30 0.83 0.93 0.96 0.98 28 – – – – – 0.30 0.82 0.94 0.96 0.98 30 – – – – – 0.29 0.81 0.94 0.95 0.98 32 – – – – – 0.30 0.81 0.95 0.95 0.99 34 – – – – – 0.30 0.81 0.96 0.95 0.99 36 – – – – – 0.30 0.82 0.96 0.94 1.00 38 – – – – – 0.31 0.82 0.97 0.94 1.00 40 – – – – – 0.31 0.83 0.98 0.94 1.00 42 – – – – – 0.32 0.84 0.98 0.94 1.00 44 – – – – – 0.33 0.85 0.99 0.94 1.01 46 – – – – – 0.34 0.86 1.00 0.94 1.01 48 – – – – – 0.35 0.87 1.00 0.94 1.01 50 – – – – – 0.36 0.88 1.01 0.94 1.01 55 – – – – – 0.38 0.90 1.02 0.94 1.02 60 – – – – – 0.41 0.93 1.04 0.94 1.02 65 – – – 2.65 – 0.44 0.96 1.05 0.94 1.02 70 – – – 2.31 – 0.46 0.98 1.06 0.94 1.02 75 – – – 2.06 – 0.49 1.00 1.07 0.94 1.03 80 – – – 1.87 – 0.52 1.02 1.07 0.94 1.03 85 – – – 1.73 – 0.55 1.04 1.08 0.94 1.03 90 – – – 1.61 2.67 0.58 1.06 1.09 0.94 1.03 95 – – – 1.52 2.34 0.61 1.08 1.09 0.94 1.03 100 – – – 1.45 2.09 0.64 1.10 1.10 0.94 1.03 110 – – – 1.34 1.74 0.70 1.12 1.11 0.95 1.04 120 – – – 1.26 1.51 0.76 1.15 1.12 0.95 1.04 130 – – – 1.20 1.35 0.81 1.17 1.12 0.95 1.04 140 – – – 1.16 1.24 0.86 1.19 1.13 0.95 1.04 150 – – – 1.12 1.16 0.91 1.21 1.13 0.95 1.04 160 – – – 1.10 1.10 0.95 1.22 1.14 0.95 1.04 170 – – 2.93 1.08 1.05 1.00 1.24 1.14 0.95 1.04 180 – – 2.61 1.06 1.02 1.04 1.25 1.14 0.95 1.04 190 – – 2.36 1.05 0.99 1.07 1.26 1.15 0.95 1.05

200 – 2.87 2.16 1.04 0.97 1.11 1.27 1.15 0.95 1.05 210 – 2.62 2.00 1.03 0.96 1.14 1.28 1.15 0.95 1.05 220 – 2.41 1.87 1.02 0.95 1.17 1.29 1.15 0.95 1.05 230 – 2.25 1.76 1.02 0.94 1.20 1.29 1.16 0.95 1.05 240 – 2.11 1.67 1.01 0.93 1.23 1.30 1.16 0.95 1.05 250 – 1.99 1.59 1.01 0.93 1.26 1.31 1.16 0.95 1.05 260 – 1.89 1.53 1.00 0.93 1.28 1.31 1.16 0.95 1.05 270 – 1.81 1.47 1.00 0.93 1.30 1.32 1.16 0.95 1.05 280 – 1.73 1.42 1.00 0.93 1.32 1.32 1.16 0.95 1.05 290 – 1.67 1.38 1.00 0.93 1.34 1.33 1.17 0.95 1.05 300 – 1.61 1.34 1.00 0.93 1.36 1.33 1.17 0.95 1.05 320 – 1.52 1.28 0.99 0.93 1.40 1.34 1.17 0.95 1.05 340 – 1.45 1.23 0.99 0.94 1.43 1.35 1.17 0.95 1.05 360 – 1.39 1.19 0.99 0.94 1.46 1.35 1.17 0.95 1.05 380 – 1.34 1.16 0.99 0.95 1.48 1.36 1.17 0.95 1.05 400 – 1.30 1.14 0.99 0.95 1.51 1.36 1.17 0.95 1.05 420 – 1.26 1.11 0.99 0.96 1.53 1.37 1.18 0.95 1.05 440 – 1.23 1.10 0.99 0.97 1.55 1.37 1.18 0.95 1.05 460 – 1.21 1.08 0.99 0.97 1.56 1.38 1.18 0.95 1.05 480 – 1.19 1.07 0.99 0.98 1.58 1.38 1.18 0.95 1.05 500 – 1.17 1.06 0.99 0.99 1.60 1.38 1.18 0.95 1.05 550 2.48 1.13 1.04 0.99 1.00 1.63 1.39 1.18 0.95 1.05 600 2.10 1.10 1.02 0.99 1.01 1.66 1.40 1.18 0.95 1.05 650 1.85 1.08 1.01 0.99 1.03 1.68 1.40 1.18 0.95 1.05 700 1.67 1.07 1.00 1.00 1.04 1.70 1.40 1.19 0.95 1.05 750 1.54 1.05 1.00 1.00 1.05 1.72 1.41 1.19 0.95 1.05 800 1.45 1.04 1.00 1.00 1.05 1.73 1.41 1.19 0.95 1.05 850 1.37 1.04 0.99 1.00 1.06 1.75 1.41 1.19 0.95 1.05 900 1.31 1.03 0.99 1.00 1.07 1.76 1.42 1.19 0.95 1.05 950 1.27 1.02 0.99 1.00 1.08 1.77 1.42 1.19 0.95 1.05 1000 1.23 1.02 0.99 1.00 1.08 1.78 1.42 1.19 0.95 1.05 1100 1.17 1.01 0.99 1.00 1.09 1.79 1.42 1.19 0.95 1.05 1200 1.13 1.01 0.99 1.01 1.10 1.81 1.43 1.19 0.95 1.05 1300 1.10 1.00 0.99 1.01 1.11 1.82 1.43 1.19 0.95 1.05 1400 1.07 1.00 0.99 1.01 1.11 1.83 1.43 1.19 0.95 1.06 1500 1.06 1.00 0.99 1.01 1.12 1.84 1.43 1.19 0.96 1.06 2000 1.01 0.99 0.99 1.01 1.14 1.87 1.44 1.19 0.96 1.06 3000 0.99 0.99 1.00 1.02 1.15 1.89 1.44 1.20 0.96 1.06 5000 0.99 0.99 1.00 1.02 1.17 1.92 1.45 1.20 0.96 1.06 7000 0.99 0.99 1.01 1.02 1.17 1.93 1.45 1.20 0.96 1.06 9000 0.99 0.99 1.01 1.02 1.18 1.93 1.45 1.20 0.96 1.06 10000 0.99 0.99 1.01 1.02 1.18 1.93 1.45 1.20 0.96 1.06 12000 0.99 0.99 1.01 1.02 1.18 1.94 1.45 1.20 0.96 1.06 14000 0.99 0.99 1.01 1.02 1.18 1.94 1.45 1.20 0.96 1.06 16000 0.99 0.99 1.01 1.02 1.18 1.94 1.45 1.20 0.96 1.06 18000 0.99 0.99 1.01 1.02 1.18 1.94 1.45 1.20 0.96 1.06 20000 0.99 0.99 1.01 1.02 1.18 1.94 1.45 1.20 0.96 1.06

Table B.0-3: Color correction factors for spectra of the form I_ν ∝ ν^{0.5}B_ν (T ) T DIRBE band (K) 1 2 3 4 5 6 7 8 9 10 10 – – – – – – – 1.29 1.49 0.98 12 – – – – – 1.31 2.09 1.10 1.24 0.95 14 – – – – – 0.73 1.48 1.01 1.12 0.95 16 – – – – – 0.51 1.18 0.96 1.05 0.95 18 – – – – – 0.41 1.02 0.94 1.01 0.96 20 – – – – – 0.35 0.93 0.93 0.98 0.97 22 – – – – – 0.32 0.87 0.93 0.96 0.97 24 – – – – – 0.31 0.84 0.93 0.95 0.98 26 – – – – – 0.30 0.82 0.93 0.95 0.99 28 – – – – – 0.29 0.81 0.94 0.94 0.99 30 – – – – – 0.29 0.81 0.95 0.94 1.00 32 – – – – – 0.30 0.81 0.96 0.94 1.00 34 – – – – – 0.30 0.81 0.97 0.94 1.01 36 – – – – – 0.31 0.82 0.98 0.93 1.01 38 – – – – – 0.31 0.83 0.99 0.93 1.02 40 – – – – – 0.32 0.84 1.00 0.93 1.02 42 – – – – – 0.33 0.85 1.00 0.93 1.02 44 – – – – – 0.34 0.86 1.01 0.93 1.03 46 – – – – – 0.35 0.88 1.02 0.94 1.03 48 – – – – – 0.36 0.89 1.03 0.94 1.03 50 – – – – – 0.37 0.90 1.04 0.94 1.03 55 – – – – – 0.39 0.94 1.05 0.94 1.04 60 – – – – – 0.42 0.97 1.07 0.94 1.04 65 – – – 2.59 – 0.46 1.00 1.08 0.94 1.05 70 – – – 2.26 – 0.49 1.03 1.09 0.94 1.05 75 – – – 2.02 – 0.52 1.05 1.10 0.94 1.05 80 – – – 1.84 – 0.55 1.08 1.11 0.94 1.05 85 – – – 1.70 2.78 0.59 1.10 1.12 0.95 1.06 90 – – – 1.59 2.40 0.62 1.12 1.13 0.95 1.06 95 – – – 1.50 2.12 0.66 1.14 1.14 0.95 1.06 100 – – – 1.43 1.90 0.69 1.16 1.14 0.95 1.06 110 – – – 1.32 1.59 0.76 1.20 1.15 0.95 1.06 120 – – – 1.24 1.39 0.82 1.23 1.16 0.95 1.07 130 – – – 1.19 1.25 0.88 1.25 1.17 0.95 1.07 140 – – – 1.14 1.16 0.94 1.28 1.18 0.95 1.07 150 – – – 1.11 1.09 1.00 1.30 1.18 0.95 1.07 160 – – – 1.09 1.04 1.05 1.31 1.19 0.95 1.07 170 – – 2.80 1.07 1.00 1.10 1.33 1.19 0.95 1.07 180 – – 2.49 1.05 0.97 1.15 1.34 1.19 0.96 1.07 190 – – 2.26 1.04 0.95 1.19 1.36 1.20 0.96 1.07

200 – 2.78 2.07 1.03 0.94 1.23 1.37 1.20 0.96 1.08 210 – 2.54 1.92 1.02 0.93 1.27 1.38 1.20 0.96 1.08 220 – 2.34 1.79 1.02 0.92 1.30 1.39 1.21 0.96 1.08 230 – 2.18 1.69 1.01 0.92 1.34 1.40 1.21 0.96 1.08 240 – 2.05 1.61 1.01 0.92 1.37 1.41 1.21 0.96 1.08 250 – 1.94 1.54 1.00 0.92 1.40 1.41 1.21 0.96 1.08 260 – 1.84 1.47 1.00 0.92 1.43 1.42 1.21 0.96 1.08 270 – 1.76 1.42 1.00 0.92 1.45 1.43 1.22 0.96 1.08 280 – 1.69 1.38 1.00 0.92 1.48 1.43 1.22 0.96 1.08 290 – 1.63 1.34 0.99 0.92 1.50 1.44 1.22 0.96 1.08 300 – 1.58 1.30 0.99 0.93 1.53 1.44 1.22 0.96 1.08 320 – 1.49 1.25 0.99 0.94 1.57 1.45 1.22 0.96 1.08 340 – 1.42 1.20 0.99 0.94 1.60 1.46 1.22 0.96 1.08 360 – 1.36 1.16 0.99 0.95 1.64 1.47 1.23 0.96 1.08 380 – 1.31 1.14 0.99 0.96 1.67 1.48 1.23 0.96 1.08 400 – 1.27 1.11 0.99 0.97 1.69 1.48 1.23 0.96 1.08 420 – 1.24 1.09 0.99 0.98 1.72 1.49 1.23 0.96 1.08 440 – 1.21 1.08 0.99 0.99 1.74 1.49 1.23 0.96 1.08 460 – 1.19 1.06 0.99 1.00 1.76 1.50 1.23 0.96 1.08 480 – 1.17 1.05 0.99 1.01 1.78 1.50 1.23 0.96 1.08 500 2.93 1.15 1.04 0.99 1.02 1.80 1.50 1.24 0.96 1.08 550 2.35 1.12 1.02 0.99 1.04 1.84 1.51 1.24 0.96 1.08 600 2.00 1.09 1.01 0.99 1.05 1.87 1.52 1.24 0.96 1.08 650 1.77 1.07 1.00 1.00 1.07 1.90 1.52 1.24 0.96 1.08 700 1.61 1.06 1.00 1.00 1.08 1.92 1.53 1.24 0.96 1.08 750 1.49 1.04 0.99 1.00 1.09 1.94 1.53 1.24 0.96 1.09 800 1.40 1.04 0.99 1.00 1.10 1.96 1.54 1.24 0.96 1.09 850 1.33 1.03 0.99 1.00 1.11 1.97 1.54 1.24 0.96 1.09 900 1.28 1.02 0.99 1.00 1.12 1.99 1.54 1.25 0.96 1.09 950 1.23 1.02 0.99 1.00 1.13 2.00 1.55 1.25 0.96 1.09 1000 1.20 1.01 0.99 1.01 1.14 2.01 1.55 1.25 0.96 1.09 1100 1.14 1.01 0.99 1.01 1.15 2.03 1.55 1.25 0.96 1.09 1200 1.10 1.00 0.99 1.01 1.16 2.05 1.55 1.25 0.96 1.09 1300 1.08 1.00 0.99 1.01 1.17 2.06 1.56 1.25 0.96 1.09 1400 1.06 1.00 0.99 1.01 1.17 2.07 1.56 1.25 0.96 1.09 1500 1.04 0.99 0.99 1.01 1.18 2.08 1.56 1.25 0.96 1.09 2000 1.00 0.99 1.00 1.02 1.20 2.11 1.57 1.25 0.96 1.09 3000 0.98 0.99 1.00 1.02 1.22 2.15 1.58 1.25 0.96 1.09 5000 0.98 0.99 1.01 1.02 1.24 2.17 1.58 1.25 0.96 1.09 7000 0.99 0.99 1.01 1.02 1.25 2.19 1.58 1.26 0.96 1.09 9000 0.99 0.99 1.01 1.02 1.25 2.19 1.59 1.26 0.96 1.09 10000 0.99 0.99 1.01 1.02 1.25 2.19 1.59 1.26 0.96 1.09 12000 0.99 0.99 1.01 1.02 1.26 2.20 1.59 1.26 0.96 1.09 14000 0.99 0.99 1.02 1.03 1.26 2.20 1.59 1.26 0.96 1.09 16000 0.99 0.99 1.02 1.03 1.26 2.20 1.59 1.26 0.96 1.09 18000 0.99 0.99 1.02 1.03 1.26 2.20 1.59 1.26 0.96 1.09 20000 0.99 0.99 1.02 1.03 1.26 2.20 1.59 1.26 0.96 1.09

Table B.0-4: Color correction factors for spectra of the form I_ν ∝ νB_ν (T ) T DIRBE band (K) 1 2 3 4 5 6 7 8 9 10 10 – – – – – – – 1.24 1.40 0.96 12 – – – – – 1.25 1.95 1.07 1.18 0.94 14 – – – – – 0.70 1.39 0.98 1.07 0.95 16 – – – – – 0.49 1.12 0.95 1.01 0.95 18 – – – – – 0.40 0.98 0.93 0.98 0.96 20 – – – – – 0.35 0.90 0.92 0.96 0.98 22 – – – – – 0.32 0.85 0.92 0.95 0.99 24 – – – – – 0.30 0.82 0.93 0.94 1.00 26 – – – – – 0.30 0.81 0.94 0.93 1.00 28 – – – – – 0.29 0.80 0.95 0.93 1.01 30 – – – – – 0.29 0.80 0.96 0.93 1.02 32 – – – – – 0.30 0.81 0.97 0.93 1.03 34 – – – – – 0.30 0.82 0.98 0.93 1.03 36 – – – – – 0.31 0.83 1.00 0.93 1.04 38 – – – – – 0.32 0.84 1.01 0.93 1.04 40 – – – – – 0.32 0.86 1.02 0.93 1.05 42 – – – – – 0.33 0.87 1.03 0.93 1.05 44 – – – – – 0.34 0.89 1.04 0.93 1.05 46 – – – – – 0.35 0.90 1.05 0.94 1.06 48 – – – – – 0.37 0.92 1.06 0.94 1.06 50 – – – – – 0.38 0.93 1.07 0.94 1.06 55 – – – – – 0.41 0.97 1.09 0.94 1.07 60 – – – 3.00 – 0.44 1.01 1.10 0.94 1.07 65 – – – 2.54 – 0.48 1.05 1.12 0.95 1.08 70 – – – 2.21 – 0.51 1.08 1.13 0.95 1.08 75 – – – 1.98 – 0.55 1.11 1.15 0.95 1.08 80 – – – 1.80 2.95 0.59 1.14 1.16 0.95 1.09 85 – – – 1.66 2.50 0.63 1.17 1.17 0.95 1.09 90 – – – 1.56 2.17 0.67 1.20 1.18 0.95 1.09 95 – – – 1.47 1.92 0.71 1.22 1.18 0.95 1.09 100 – – – 1.40 1.73 0.75 1.24 1.19 0.96 1.10 110 – – – 1.30 1.46 0.82 1.28 1.20 0.96 1.10 120 – – – 1.23 1.28 0.90 1.32 1.21 0.96 1.10 130 – – – 1.17 1.17 0.97 1.35 1.22 0.96 1.10 140 – – – 1.13 1.09 1.03 1.38 1.23 0.96 1.11 150 – – – 1.10 1.03 1.10 1.40 1.24 0.96 1.11 160 – – – 1.08 0.99 1.16 1.42 1.24 0.96 1.11 170 – – 2.67 1.06 0.96 1.22 1.44 1.25 0.97 1.11 180 – – 2.38 1.05 0.94 1.27 1.46 1.25 0.97 1.11 190 – 2.99 2.16 1.03 0.92 1.32 1.47 1.26 0.97 1.11

200 – 2.70 1.98 1.03 0.92 1.37 1.49 1.26 0.97 1.11 210 – 2.46 1.84 1.02 0.91 1.41 1.50 1.26 0.97 1.11 220 – 2.28 1.73 1.01 0.91 1.46 1.51 1.27 0.97 1.11 230 – 2.12 1.63 1.01 0.91 1.50 1.52 1.27 0.97 1.11 240 – 2.00 1.55 1.00 0.91 1.53 1.53 1.27 0.97 1.11 250 – 1.89 1.48 1.00 0.91 1.57 1.54 1.27 0.97 1.12 260 – 1.80 1.43 1.00 0.91 1.60 1.55 1.28 0.97 1.12 270 – 1.72 1.38 0.99 0.92 1.63 1.56 1.28 0.97 1.12 280 – 1.65 1.33 0.99 0.92 1.66 1.56 1.28 0.97 1.12 290 – 1.59 1.30 0.99 0.93 1.69 1.57 1.28 0.97 1.12 300 – 1.54 1.27 0.99 0.94 1.72 1.57 1.28 0.97 1.12 320 – 1.45 1.21 0.99 0.95 1.76 1.59 1.29 0.97 1.12 340 – 1.39 1.17 0.99 0.96 1.81 1.60 1.29 0.97 1.12 360 – 1.33 1.14 0.99 0.97 1.85 1.60 1.29 0.97 1.12 380 – 1.29 1.11 0.99 0.99 1.88 1.61 1.29 0.97 1.12 400 – 1.25 1.09 0.99 1.00 1.91 1.62 1.29 0.97 1.12 420 – 1.22 1.07 0.99 1.01 1.94 1.63 1.30 0.97 1.12 440 – 1.19 1.06 0.99 1.02 1.97 1.63 1.30 0.97 1.12 460 – 1.17 1.05 0.99 1.04 1.99 1.64 1.30 0.97 1.12 480 – 1.15 1.04 0.99 1.05 2.01 1.64 1.30 0.97 1.12 500 2.76 1.13 1.03 0.99 1.06 2.04 1.65 1.30 0.97 1.12 550 2.23 1.10 1.01 0.99 1.08 2.08 1.66 1.30 0.97 1.12 600 1.91 1.08 1.00 1.00 1.10 2.12 1.66 1.30 0.97 1.12 650 1.69 1.06 0.99 1.00 1.12 2.15 1.67 1.31 0.98 1.12 700 1.55 1.05 0.99 1.00 1.14 2.18 1.68 1.31 0.98 1.12 750 1.44 1.04 0.99 1.00 1.15 2.20 1.68 1.31 0.98 1.12 800 1.35 1.03 0.98 1.00 1.16 2.22 1.69 1.31 0.98 1.12 850 1.29 1.02 0.98 1.01 1.17 2.24 1.69 1.31 0.98 1.12 900 1.24 1.01 0.98 1.01 1.19 2.26 1.69 1.31 0.98 1.12 950 1.20 1.01 0.98 1.01 1.19 2.27 1.70 1.31 0.98 1.12 1000 1.17 1.01 0.98 1.01 1.20 2.28 1.70 1.31 0.98 1.12 1100 1.12 1.00 0.99 1.01 1.22 2.31 1.70 1.31 0.98 1.13 1200 1.08 1.00 0.99 1.01 1.23 2.33 1.71 1.32 0.98 1.13 1300 1.06 0.99 0.99 1.01 1.24 2.34 1.71 1.32 0.98 1.13 1400 1.04 0.99 0.99 1.02 1.25 2.35 1.71 1.32 0.98 1.13 1500 1.03 0.99 0.99 1.02 1.26 2.37 1.72 1.32 0.98 1.13 2000 0.99 0.99 1.00 1.02 1.28 2.41 1.72 1.32 0.98 1.13 3000 0.98 0.99 1.01 1.02 1.31 2.45 1.73 1.32 0.98 1.13 5000 0.99 0.99 1.02 1.03 1.33 2.48 1.74 1.32 0.98 1.13 7000 0.99 0.99 1.02 1.03 1.34 2.49 1.74 1.32 0.98 1.13 9000 0.99 0.99 1.02 1.03 1.35 2.50 1.74 1.32 0.98 1.13 10000 0.99 0.99 1.02 1.03 1.35 2.50 1.74 1.32 0.98 1.13 12000 1.00 0.99 1.02 1.03 1.35 2.50 1.74 1.32 0.98 1.13 14000 1.00 0.99 1.02 1.03 1.35 2.51 1.75 1.32 0.98 1.13 16000 1.00 0.99 1.02 1.03 1.35 2.51 1.75 1.32 0.98 1.13 18000 1.00 0.99 1.02 1.03 1.35 2.51 1.75 1.32 0.98 1.13 20000 1.00 0.99 1.03 1.03 1.35 2.51 1.75 1.32 0.98 1.13

Table B.0-5: Color correction factors for spectra of the form I_ν ∝ ν^{1.5}B_ν (T ) T DIRBE band (K) 1 2 3 4 5 6 7 8 9 10 10 – – – – – – – 1.20 1.31 0.94 12 – – – – – 1.19 1.82 1.04 1.12 0.94 14 – – – – – 0.68 1.31 0.96 1.03 0.95 16 – – – – – 0.48 1.07 0.93 0.98 0.96 18 – – – – – 0.39 0.94 0.92 0.96 0.98 20 – – – – – 0.34 0.87 0.92 0.94 0.99 22 – – – – – 0.31 0.83 0.93 0.93 1.00 24 – – – – – 0.30 0.81 0.94 0.93 1.02 26 – – – – – 0.29 0.80 0.95 0.92 1.03 28 – – – – – 0.29 0.80 0.96 0.92 1.04 30 – – – – – 0.29 0.81 0.98 0.92 1.05 32 – – – – – 0.30 0.82 0.99 0.93 1.05 34 – – – – – 0.30 0.83 1.01 0.93 1.06 36 – – – – – 0.31 0.84 1.02 0.93 1.07 38 – – – – – 0.32 0.86 1.03 0.93 1.07 40 – – – – – 0.33 0.88 1.05 0.93 1.08 42 – – – – – 0.34 0.90 1.06 0.94 1.08 44 – – – – – 0.35 0.91 1.07 0.94 1.09 46 – – – – – 0.36 0.93 1.08 0.94 1.09 48 – – – – – 0.38 0.95 1.09 0.94 1.09 50 – – – – – 0.39 0.97 1.10 0.94 1.10 55 – – – – – 0.42 1.02 1.13 0.95 1.10 60 – – – 2.93 – 0.46 1.06 1.15 0.95 1.11 65 – – – 2.48 – 0.50 1.11 1.17 0.95 1.12 70 – – – 2.17 – 0.54 1.15 1.18 0.96 1.12 75 – – – 1.94 – 0.59 1.18 1.20 0.96 1.12 80 – – – 1.77 2.65 0.63 1.22 1.21 0.96 1.13 85 – – – 1.63 2.25 0.67 1.25 1.22 0.96 1.13 90 – – – 1.53 1.96 0.72 1.28 1.23 0.97 1.13 95 – – – 1.45 1.74 0.76 1.31 1.24 0.97 1.13 100 – – – 1.38 1.58 0.81 1.34 1.25 0.97 1.14 110 – – – 1.28 1.34 0.90 1.39 1.26 0.97 1.14 120 – – – 1.21 1.19 0.98 1.43 1.28 0.97 1.14 130 – – – 1.16 1.09 1.06 1.46 1.29 0.98 1.15 140 – – – 1.12 1.03 1.14 1.49 1.29 0.98 1.15 150 – – – 1.09 0.98 1.22 1.52 1.30 0.98 1.15 160 – – 2.91 1.07 0.95 1.29 1.55 1.31 0.98 1.15 170 – – 2.55 1.05 0.93 1.35 1.57 1.31 0.98 1.15 180 – – 2.28 1.04 0.91 1.42 1.59 1.32 0.98 1.15 190 – 2.89 2.07 1.03 0.90 1.48 1.61 1.32 0.98 1.16

200 – 2.62 1.91 1.02 0.90 1.53 1.62 1.33 0.98 1.16 210 – 2.39 1.77 1.01 0.90 1.59 1.64 1.33 0.98 1.16 220 – 2.21 1.66 1.01 0.90 1.63 1.65 1.34 0.98 1.16 230 – 2.07 1.57 1.00 0.90 1.68 1.67 1.34 0.98 1.16 240 – 1.94 1.50 1.00 0.91 1.72 1.68 1.34 0.99 1.16 250 – 1.84 1.44 1.00 0.91 1.77 1.69 1.34 0.99 1.16 260 – 1.75 1.38 0.99 0.92 1.80 1.70 1.35 0.99 1.16 270 – 1.68 1.34 0.99 0.93 1.84 1.71 1.35 0.99 1.16 280 – 1.61 1.30 0.99 0.94 1.87 1.72 1.35 0.99 1.16 290 – 1.56 1.26 0.99 0.94 1.91 1.72 1.35 0.99 1.16 300 – 1.51 1.23 0.99 0.95 1.94 1.73 1.36 0.99 1.16 320 – 1.42 1.18 0.99 0.97 1.99 1.74 1.36 0.99 1.16 340 – 1.36 1.14 0.99 0.99 2.04 1.76 1.36 0.99 1.16 360 – 1.31 1.11 0.99 1.01 2.09 1.77 1.36 0.99 1.16 380 – 1.26 1.09 0.99 1.02 2.13 1.78 1.37 0.99 1.17 400 – 1.23 1.07 0.99 1.04 2.17 1.78 1.37 0.99 1.17 420 – 1.20 1.05 0.99 1.05 2.20 1.79 1.37 0.99 1.17 440 – 1.17 1.04 0.99 1.07 2.23 1.80 1.37 0.99 1.17 460 – 1.15 1.03 0.99 1.08 2.26 1.80 1.37 0.99 1.17 480 2.88 1.13 1.02 0.99 1.10 2.29 1.81 1.37 0.99 1.17 500 2.60 1.12 1.01 0.99 1.11 2.31 1.82 1.38 0.99 1.17 550 2.12 1.09 1.00 1.00 1.14 2.37 1.83 1.38 0.99 1.17 600 1.82 1.07 0.99 1.00 1.16 2.41 1.84 1.38 0.99 1.17 650 1.63 1.05 0.99 1.00 1.19 2.45 1.84 1.38 0.99 1.17 700 1.49 1.04 0.98 1.00 1.21 2.48 1.85 1.38 0.99 1.17 750 1.39 1.03 0.98 1.01 1.22 2.51 1.86 1.39 0.99 1.17 800 1.31 1.02 0.98 1.01 1.24 2.53 1.86 1.39 0.99 1.17 850 1.25 1.01 0.98 1.01 1.25 2.55 1.87 1.39 0.99 1.17 900 1.21 1.01 0.98 1.01 1.26 2.57 1.87 1.39 0.99 1.17 950 1.17 1.00 0.98 1.01 1.28 2.59 1.87 1.39 0.99 1.17 1000 1.14 1.00 0.98 1.01 1.29 2.61 1.88 1.39 0.99 1.17 1100 1.10 1.00 0.99 1.02 1.30 2.63 1.88 1.39 0.99 1.17 1200 1.06 0.99 0.99 1.02 1.32 2.65 1.89 1.39 0.99 1.17 1300 1.04 0.99 0.99 1.02 1.33 2.67 1.89 1.39 0.99 1.17 1400 1.03 0.99 1.00 1.02 1.34 2.69 1.90 1.39 0.99 1.17 1500 1.01 0.99 1.00 1.02 1.35 2.70 1.90 1.40 1.00 1.17 2000 0.99 0.99 1.01 1.03 1.38 2.75 1.91 1.40 1.00 1.17 3000 0.98 0.99 1.02 1.03 1.42 2.80 1.92 1.40 1.00 1.17 5000 0.99 0.99 1.03 1.03 1.44 2.83 1.93 1.40 1.00 1.17 7000 0.99 0.99 1.03 1.03 1.45 2.85 1.93 1.40 1.00 1.17 9000 1.00 0.99 1.03 1.04 1.46 2.86 1.93 1.40 1.00 1.17 10000 1.00 0.99 1.03 1.04 1.46 2.86 1.93 1.40 1.00 1.17 12000 1.00 0.99 1.03 1.04 1.46 2.87 1.93 1.40 1.00 1.17 14000 1.00 0.99 1.03 1.04 1.46 2.87 1.93 1.40 1.00 1.17 16000 1.00 0.99 1.04 1.04 1.47 2.87 1.93 1.40 1.00 1.17 18000 1.00 0.99 1.04 1.04 1.47 2.87 1.93 1.40 1.00 1.17 20000 1.01 0.99 1.04 1.04 1.47 2.87 1.94 1.40 1.00 1.17

Table B.0-6: Color correction factors for spectra of the form I_ν ∝ ν^2B_ν (T ) T DIRBE band (K) 1 2 3 4 5 6 7 8 9 10 10 – – – – – 2.90 2.88 1.15 1.24 0.93 12 – – – – – 1.14 1.70 1.01 1.07 0.94 14 – – – – – 0.65 1.24 0.95 1.00 0.96 16 – – – – – 0.46 1.02 0.92 0.96 0.97 18 – – – – – 0.38 0.91 0.92 0.94 0.99 20 – – – – – 0.33 0.84 0.92 0.93 1.01 22 – – – – – 0.31 0.81 0.93 0.92 1.03 24 – – – – – 0.30 0.80 0.95 0.92 1.04 26 – – – – – 0.29 0.80 0.96 0.92 1.06 28 – – – – – 0.29 0.80 0.98 0.92 1.07 30 – – – – – 0.30 0.81 1.00 0.92 1.08 32 – – – – – 0.30 0.83 1.02 0.93 1.09 34 – – – – – 0.31 0.84 1.03 0.93 1.10 36 – – – – – 0.32 0.86 1.05 0.93 1.10 38 – – – – – 0.33 0.88 1.07 0.94 1.11 40 – – – – – 0.34 0.90 1.08 0.94 1.12 42 – – – – – 0.35 0.93 1.10 0.94 1.12 44 – – – – – 0.36 0.95 1.11 0.94 1.13 46 – – – – – 0.37 0.97 1.12 0.95 1.13 48 – – – – – 0.39 1.00 1.14 0.95 1.14 50 – – – – – 0.40 1.02 1.15 0.95 1.14 55 – – – – – 0.44 1.07 1.18 0.96 1.15 60 – – – 2.86 – 0.48 1.13 1.20 0.96 1.16 65 – – – 2.43 – 0.53 1.18 1.22 0.97 1.16 70 – – – 2.12 – 0.58 1.22 1.24 0.97 1.17 75 – – – 1.90 2.87 0.63 1.27 1.26 0.97 1.17 80 – – – 1.73 2.38 0.68 1.31 1.27 0.98 1.17 85 – – – 1.61 2.03 0.73 1.35 1.28 0.98 1.18 90 – – – 1.51 1.78 0.78 1.38 1.30 0.98 1.18 95 – – – 1.43 1.59 0.83 1.42 1.31 0.98 1.18 100 – – – 1.36 1.44 0.88 1.45 1.32 0.99 1.19 110 – – – 1.26 1.24 0.98 1.51 1.33 0.99 1.19 120 – – – 1.20 1.11 1.08 1.55 1.35 0.99 1.19 130 – – – 1.15 1.03 1.18 1.60 1.36 0.99 1.20 140 – – – 1.11 0.97 1.27 1.63 1.37 1.00 1.20 150 – – – 1.08 0.94 1.35 1.67 1.38 1.00 1.20 160 – – 2.78 1.06 0.91 1.44 1.70 1.39 1.00 1.20 170 – – 2.44 1.04 0.90 1.51 1.72 1.39 1.00 1.20 180 – – 2.19 1.03 0.89 1.59 1.75 1.40 1.00 1.21 190 – 2.81 1.99 1.02 0.89 1.66 1.77 1.40 1.00 1.21

200 – 2.54 1.83 1.01 0.89 1.72 1.79 1.41 1.00 1.21 210 – 2.33 1.71 1.01 0.89 1.78 1.81 1.41 1.00 1.21 220 – 2.15 1.60 1.00 0.90 1.84 1.82 1.42 1.01 1.21 230 – 2.01 1.52 1.00 0.91 1.90 1.84 1.42 1.01 1.21 240 – 1.89 1.45 1.00 0.92 1.95 1.85 1.42 1.01 1.21 250 – 1.79 1.39 0.99 0.93 1.99 1.86 1.43 1.01 1.21 260 – 1.71 1.34 0.99 0.94 2.04 1.88 1.43 1.01 1.21 270 – 1.64 1.30 0.99 0.95 2.08 1.89 1.43 1.01 1.21 280 – 1.58 1.26 0.99 0.96 2.12 1.90 1.44 1.01 1.22 290 – 1.52 1.23 0.99 0.97 2.16 1.91 1.44 1.01 1.22 300 – 1.47 1.20 0.99 0.98 2.20 1.92 1.44 1.01 1.22 320 – 1.39 1.15 0.99 1.00 2.26 1.93 1.44 1.01 1.22 340 – 1.33 1.12 0.99 1.03 2.32 1.94 1.45 1.01 1.22 360 – 1.28 1.09 0.99 1.05 2.38 1.96 1.45 1.01 1.22 380 – 1.24 1.07 0.99 1.07 2.42 1.97 1.45 1.01 1.22 400 – 1.21 1.05 0.99 1.09 2.47 1.98 1.45 1.01 1.22 420 – 1.18 1.04 0.99 1.11 2.51 1.99 1.46 1.01 1.22 440 – 1.16 1.03 0.99 1.13 2.55 2.00 1.46 1.01 1.22 460 – 1.14 1.02 0.99 1.14 2.58 2.00 1.46 1.01 1.22 480 2.71 1.12 1.01 0.99 1.16 2.61 2.01 1.46 1.01 1.22 500 2.45 1.10 1.00 1.00 1.17 2.64 2.02 1.46 1.01 1.22 550 2.02 1.08 0.99 1.00 1.21 2.70 2.03 1.47 1.01 1.22 600 1.75 1.05 0.99 1.00 1.24 2.75 2.04 1.47 1.01 1.22 650 1.57 1.04 0.98 1.00 1.27 2.80 2.05 1.47 1.02 1.22 700 1.44 1.03 0.98 1.01 1.29 2.84 2.06 1.47 1.02 1.22 750 1.34 1.02 0.98 1.01 1.31 2.87 2.07 1.47 1.02 1.22 800 1.27 1.01 0.98 1.01 1.33 2.90 2.07 1.48 1.02 1.22 850 1.22 1.01 0.98 1.01 1.35 2.92 2.08 1.48 1.02 1.23 900 1.18 1.00 0.98 1.01 1.36 2.95 2.08 1.48 1.02 1.23 950 1.14 1.00 0.99 1.02 1.38 2.97 2.09 1.48 1.02 1.23 1000 1.12 1.00 0.99 1.02 1.39 2.99 2.09 1.48 1.02 1.23 1100 1.08 0.99 0.99 1.02 1.41 3.02 2.10 1.48 1.02 1.23 1200 1.05 0.99 0.99 1.02 1.43 3.04 2.10 1.48 1.02 1.23 1300 1.03 0.99 1.00 1.02 1.44 3.06 2.11 1.48 1.02 1.23 1400 1.01 0.99 1.00 1.03 1.45 3.08 2.11 1.49 1.02 1.23 1500 1.00 0.99 1.00 1.03 1.46 3.10 2.12 1.49 1.02 1.23 2000 0.98 0.99 1.02 1.03 1.50 3.15 2.13 1.49 1.02 1.23 3000 0.98 0.99 1.03 1.04 1.54 3.21 2.14 1.49 1.02 1.23 5000 0.99 0.99 1.04 1.04 1.57 3.25 2.15 1.49 1.02 1.23 7000 1.00 0.99 1.04 1.04 1.58 3.27 2.15 1.50 1.02 1.23 9000 1.00 0.99 1.04 1.04 1.59 3.28 2.16 1.50 1.02 1.23 10000 1.01 0.99 1.04 1.04 1.59 3.29 2.16 1.50 1.02 1.23 12000 1.01 0.99 1.05 1.04 1.60 3.29 2.16 1.50 1.02 1.23 14000 1.01 0.99 1.05 1.04 1.60 3.29 2.16 1.50 1.02 1.23 16000 1.01 0.99 1.05 1.04 1.60 3.30 2.16 1.50 1.02 1.23 18000 1.01 0.99 1.05 1.04 1.60 3.30 2.16 1.50 1.02 1.23 20000 1.01 0.99 1.05 1.04 1.60 3.30 2.16 1.50 1.02 1.23

124 APPENDIX B. COLOR CORRECTION TABLES