CDF II (2 fb^{−1}) Sample Observed Predicted Δ [%] Jet 20 528 427 ± 8 -23.6 ± 5.9 Jet 50 757 724 ± 33 -3.1 ± 6.0 Jet 70 1134 1093 ± 70 -3.7 ± 7.3 Jet 100 1927 1864± 158 -3.4 ± 9.1 γ + Jets 1050 970 ± 42 -8.3 ± 5.7 ΣE_T 3574 2902± 94 -23.2 ± 4.5