ObjectMon #83 EMMonitor Slide Show

Run:234972 Event: 11125972 # of Events:51444 Time: Fri Feb 23 05:39:17 2007 Ref.Run:229936

η -4 -2 0 2 4

# Events

0 200 400 600 800 1000

1200

1400

Entries 17317 Mean -0.0004786 RMS 0.946

= 1.9 (< 5) 2χ η EMCluster

[rad] ϕ 0 1 2 3 4 5 6

# Events

260 280 300 320 340 360 380 400 420 440 460 Entries 17314 = 1.3 (< 5) 2χ ϕ EMCluster

EM Energy [GeV]

0 50 100 150 200 250 300

# Events

10 210 310 410 Entries 17317 = 5.6 (> 5) 2χ EMCluster Energy

HAD/EM

0 0.2 0.4 0.6 0.8 1

# Events

1 10 210 310 410 Entries 17317 = 1.5 (< 5) 2χ EMCluster hadE/emE

EM Et [GeV]

0 20 40 60 80 100

# Events

210

310

410 Entries 17317 = 4.9 (< 5) 2χ EMCluster emEt

η -4 -2 0 2 4

[rad] ϕ

0 1 2 3 4 5 6 Not Checked ϕ vs η EMCluster