Table I. Comparison of calculated Δ_p (keV) and experimental values of I_p and w for x = 2.0 cm

as a function of momentum p (MeV/c). The ratio r of the two values, divided by x, is also given. In

the last column, the ratio R = 1 − (_xΔ_p/w_x)/(Δ_p/w) is given, in %.

p I_p Δ_p r_Δ/x w_x w r_w/x R

105 4.5 6.023 0.669 3.617 3.999 0.553 21 117 3.782 5.156 0.682 2.938 3.557 0.606 13 132 3.364 4.527 0.672 2.474 3.223 0.651 3.3

148 3.034 4.042 0.666 2.221 2.992 0.674 −1.1 166 2.753 3.668 0.666 2.057 2.801 0.681 −2.2 186 2.545 3.377 0.663 1.953 2.651 0.678 −2.2 209 2.351 3.146 0.669 1.901 2.531 0.666 0.5 235 2.208 2.969 0.672 1.831 2.438 0.666 1.

263 2.104 2.841 0.675 1.76 2.368 0.672 0.4 295 2.026 2.744 0.677 1.727 2.315 0.670 1.0 331 1.961 2.674 0.682 1.680 2.277 0.678 0.7 372 1.924 2.629 0.683 1.635 2.251 0.688 −0.8 418 1.917 2.6 0.678 1.648 2.233 0.678 0.1

469 1.896 2.589 0.683 1.648 2.224 0.675 1.2 526 1.906 2.586 0.678 1.672 2.221 0.664 2.2 590 1.927 2.595 0.673 1.693 2.223 0.656 2.6 743 1.963 2.634 0.671 1.680 2.238 0.666 0.8

834 2.0 2.661 0.665 1.708 2.25 0.658 1.0 936 2.013 2.693 0.669 1.75 2.264 0.647 3.4 1050 2.052 2.728 0.665 1.75 2.279 0.651 2.1 1322 2.099 2.804 0.668 1.72 2.313 0.672 −0.7

1483 2.086 2.846 0.682 1.698 2.331 0.686 −0.7 1664 2.078 2.888 0.695 1.685 2.35 0.699 −0.4 1867 2.082 2.932 0.704 1.683 2.369 0.704 0 2095 2.052 2.975 0.725 1.667 2.389 0.716 1.2 2350 2.052 3.021 0.736 1.708 2.408 0.705 4.4

2637 2.078 3.064 0.774 1.659 2.428 0.732 0.7 2959 2.066 3.109 0.737 1.698 2.447 0.720 4.4 3320 2.109 3.155 0.748 1.641 2.467 0.752 −0.5 3725 2.083 3.200 0.768 1.667 2.487 0.746 2.9 4180 2.225 3.244 0.729 1.765 2.507 0.710 2.7

Table II. Comparison of calculated Δ_p (keV) and experimental values of I_p for x = 3.004 cm as a

function of momentum p (MeV/c). The ratio r of the two values, divided by x, is also given.

p I_p Δ_p r/x

166 2.906 5.790 0.663 275 2.321 4.453 0.639 331 2.057 4.258 0.689 469 1.979 4.119 0.692

661 2.010 4.147 0.687 936 2.076 4.273 0.685 1322 2.136 4.441 0.692 1867 2.164 4.701 0.723

2350 2.162 4.771 0.735 2637 2.151 4.842 0.749 2959 2.174 4.911 0.752 3320 2.149 4.984 0.772

Table III. Comparison of calculated Δ_p (keV) and experimental values of I_p for x = 4.055 cm as

a function of momentum p (MeV/c). The ratio r of the two values, divided by x, is also given.

p I_p Δ_p r/x

590 2.026 5.769 0.712 743 2.075 5.839 0.704 936 2.091 5.968 0.714 1322 2.182 6.185 0.7

Table IV. Comparison of calculated Δ_p (keV) and experimental values of I_p for x = 1.22 cm [inner

padrows] as a function of momentum p (MeV/c). The ratio r of the two values, divided by x, is also

given.

p I_p Δ_p r/x

235 2.161 1.658 0.772 418 1.825 1.443 0.775 1664 2.000 1.616 0.806 2350 1.956 1.695 0.862