-82˚

-82˚

-80˚

-80˚

-78˚

-78˚

-76˚

-76˚

-74˚

-74˚

26˚ 26˚

28˚ 28˚

30˚ 30˚

32˚ 32˚

34˚ 34˚

0 50 km

Blake Ridge

Florida

Bahamas

DSDP 533

DSDP 102

DSDP 103

DSDP 104

ODP 994,995,997

ODP 991,992,993

ODP 996

500m

1000m

2000m

3000m

4000m