ObjectMon #2 TimeMonitor HADTDC Timing

Run:166714 Event: 3573247 # of Events:58667 Time: Mon Jul 28 06:45:33 2003 Ref.Run:165873

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 418554

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

Entries 464465 Mean 566.8 RMS 7.085

CHA: Raw Time Check Ok

GOOD

Width [ns]

50 55 60

Events

0 10000

20000

30000

40000

50000

60000

70000

Entries 464465 Mean 55.68 RMS 2.516

CHA: Hit Width Check Ok

GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 394479

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 5000

10000

15000

20000

25000

30000

Entries 520896 Mean 560.7 RMS 6.893

PHA: Raw Time Check Ok

GOOD

Width [ns]

50 55 60 65

Events

0 10000

20000

30000

40000

50000

60000

70000

80000

Entries 520896 Mean 57.26 RMS 2.871

PHA: Hit Width Check Ok

GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 139820 Mean 1.666 RMS 0.7724

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

7000

Entries 160117 Mean 564.2 RMS 7.774

WHA: Raw Time Check Ok

GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

RawWidthWHA Entries 160117 Mean 54.38 RMS 2.744

WHA: Hit Width Check Ok

GOOD