6500

7000

7500

8000

8500

50 100 150 200 250 300 350 400 -2

-1

0

1

2

3

4

5

6

Sequence Position

Zscr_e of energy difference computed in HIV-1 (BRU) mRNA by different windows

Window: 170-nt, Segment: 7391--7560, Zscr_e: 5.38, Yellow

Window: 236-nt, Segment: 7361--7596, Zscr_e: 5.22, Red

Window: 340-nt, Segment: 7311--7650, Zscr_e: 5.01, Black

Window Size

Zscr e