exe_bgrid SIheff

50 100 150 200 250 300 350 400 50 100 150 200 250 300 350

0

2

4

6

8

10

exe_cgrid_lsr SIheff

50 100 150 200 250 300 350 400 50 100 150 200 250 300 350

0

2

4

6

8

10

exe_cgrid_evp SIheff

50 100 150 200 250 300 350 400 50 100 150 200 250 300 350

0

2

4

6

8

10