 Directory: /scratch/ambrose/asdqtest/nov09/

   S Q C phi slt rpt cr sl i tdcn
   - - --- --- --- --- -- -- - ----
   8 C 348 263 105 512 17 14 0 SEB2
   8 C 350 263 105 513 17 14 1 SEB2
   8 C 352 263 105 514 17 14 2 SEB2
   8 C 354 263 105 515 17 14 3 SEB2

 DTH scan: 170-700 mV, 10 mV steps (54 points)

 Ranges: TIM WID ATN QEN DTH OSC

   min: 432.4 29.5 18.8 21.8 510 190
   max: 441.2 37.3 24.5 27.6 580 290
   avg: 435.9 33.4 21.5 24.7 537 191

 Cell summary:

   SL8-348 (C,512,17-14-0): OKAY
   SL8-349 (C,512,17-14-0): OKAY
   SL8-350 (C,513,17-14-1): OKAY
   SL8-351 (C,513,17-14-1): OKAY
   SL8-352 (C,514,17-14-2): OKAY
   SL8-353 (C,514,17-14-2): OKAY
   SL8-354 (C,515,17-14-3): OKAY
   SL8-355 (C,515,17-14-3): OKAY

Wire summary:

   SL8-353 (C,514,17-14-2): #07/67 N = 1.006 (1.110,0.000,0.000,0.984)