ObjectMon #2 TimeMonitor HADTDC Timing

Run:178757 Event: 316344 # of Events:8399 Time: Mon Feb 2 12:03:06 2004 Ref.Run:175915

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 73531

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

3500

4000

Entries 80260 Mean 567.2 RMS 7.014

CHA: Raw Time

/ndf=8.9e+02 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

Entries 80260 Mean 55.45 RMS 2.531

CHA: Hit Width

/ndf= 55 (>15) 2χ BAD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 75447

PHA: Eff.

Eff. Check Failed BAD

raw time [ns]

550 560 570

Events

0 1000

2000

3000

4000

5000

6000

Entries 101739 Mean 561.4 RMS 5.879

PHA: Raw Time

/ndf=4.1e+02 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 101739 Mean 57.01 RMS 2.607

PHA: Hit Width

/ndf= 14 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 26227 Mean 1.682 RMS 0.7653

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

Entries 29948 Mean 564.8 RMS 7.829

WHA: Raw Time

/ndf=2.5e+02 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

3500

RawWidthWHA Entries 29948 Mean 54.19 RMS 2.93

WHA: Hit Width /ndf= 75 (>15) 2χ BAD