0 5 10 15 20 25 0

20

40

60

80

100

120 htemp Nent = 315 Mean = 9.75238 RMS = 8.96885

pid_1 {mease > 1.5 && mease < 2.0}_{htemp}

0 5 10 15 20 25 0

20

40

60

80

100 htemp Nent = 159 Mean = 3.47799 RMS = 4.95874

pid_1 {...}_{htemp}