 Directory: /scratch/ambrose/asdqtest/nov09/

   S Q C phi slt rpt cr sl i tdcn
   - - --- --- --- --- -- -- - ----
   5 D 304 332 140 712 19 13 0 NEB1
   5 D 306 332 140 713 19 13 1 NEB1
   5 D 308 332 140 714 19 13 2 NEB1
   5 D 310 332 140 715 19 13 3 NEB1

 DTH scan: 170-700 mV, 10 mV steps (54 points)

 Ranges: TIM WID ATN QEN DTH OSC

   min: 435.4 30.0 17.6 22.0 430 190
   max: 442.1 37.8 25.6 28.2 590 540
   avg: 438.5 32.8 21.0 24.0 532 193

 Cell summary:

   SL5-304 (D,712,19-13-0): OKAY
   SL5-305 (D,712,19-13-0): OKAY
   SL5-306 (D,713,19-13-1): OKAY
   SL5-307 (D,713,19-13-1): OKAY --> 1 TRK
   SL5-308 (D,714,19-13-2): OKAY
   SL5-309 (D,714,19-13-2): OKAY
   SL5-310 (D,715,19-13-3): OKAY
   SL5-311 (D,715,19-13-3): OKAY

Wire summary:

   SL5-307 (D,713,19-13-1): #03/39 N = 1.000 (1.000,0.000,0.000,0.000) --> TRK
   SL5-309 (D,714,19-13-2): #07/67 W = 37.8 (32.8+/-4.5) +4.9
                                   A = 25.6 (20.9+/-4.5) +4.7
   SL5-310 (D,715,19-13-3): #00/72 D = 430 (537+/-70) -107