hp25 Entries 1495777 Mean -0.01081 RMS 0.9495

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

140 150 160 170 180 190 200_{hp25}

PH Doublet (Low ADC) vs eta (w/o ADC 254)

hp45 Entries 1774770 Mean 0.006038 RMS 0.9965

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 150 160 170 180 190 200 210 220 230_{hp45}

PH Doublet (Low ADC) vs eta (w/ 254)