hp12 Entries 1120628 Mean -0.03545 RMS 0.7752

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 150 160 170 180 190 200 210 220 PH Singlet vs eta (w/o ADC 254)

hp17 Entries 1759858 Mean -0.005441 RMS 0.9226

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 170 180 190 200 210 220 230 240 250 hp17

PH Singlet vs eta (w/ 254)