 Directory: /scratch/ambrose/asdqtest/nov09/

   S Q C phi slt rpt cr sl i tdcn
   - - --- --- --- --- -- -- - ----
   6 C 232 220 087 456 06 12 0 SWB1
   6 C 234 220 087 457 06 12 1 SWB1
   6 C 236 220 087 458 06 12 2 SWB1
   6 C 238 220 087 459 06 12 3 SWB1

 DTH scan: 170-700 mV, 10 mV steps (54 points)

 Ranges: TIM WID ATN QEN DTH OSC

   min: 436.7 0.0 0.0 0.0 420 190
   max: 557.5 35.2 23.2 26.5 580 490
   avg: 440.7 32.6 20.8 23.8 530 193

 Cell summary:

   SL6-232 (C,456,06-12-0): OKAY
   SL6-233 (C,456,06-12-0): OKAY
   SL6-234 (C,457,06-12-1): OKAY
   SL6-235 (C,457,06-12-1): OKAY
   SL6-236 (C,458,06-12-2): OKAY
   SL6-237 (C,458,06-12-2): OKAY
   SL6-238 (C,459,06-12-3): OKAY
   SL6-239 (C,459,06-12-3): OKAY

Wire summary:

   SL6-236 (C,458,06-12-2): #00/48 N = 1.002 (1.000,0.000,0.000,1.317)
                                   T = 557.5 (439.4+/-7.0) +118.1
                                   W = 0.0 (32.8+/-4.5) -32.8
                                   A = 0.0 (20.9+/-4.5) -20.9
                                   Q = 0.0 (23.9+/-4.5) -23.9
                                   D = 420 (537+/-70) -117
   SL6-237 (C,458,06-12-2): #07/67 N = 1.051 (1.659,0.000,0.000,0.945)