Fermilab

Doc Number: Beams-doc-3295

Category: Notes

Bruce C. Brown Main Injector Group Fermi National Accelerator Laboratory* P.O. Box 500 Batavia, Illinois 60510

1/30/2009

Department of Energy.

Abstract

Introduction

A Measurement with 10 ms Resolution

Analysis A B C D Loss from 229 through 309 (rads) 1.476 .817 .789 .946 Loss from 310 through 315 (rads) 0.055 .018 .015 .023 Sum Loss around Ring (pfsum rads) 1.586 .847 .813 .976 Fraction from 229 through 309 .931 .964 .971 .969 Fraction from 310 through 315 .035 .018 .019 .023 Fraction from 229 through 315 .966 .985 .990 .993

Analysis Description A B C D Note

Caveats

Conclusions

References

FERMILAB-CONF-08-392-AD