0

500 1000

2000

3000

4000

5000

6000

8000

10000

12000

16000

20000

24000

100 A=273

ZP A354, 229(1996) Evaluator: R.B. Firestone

273 110110

Q_α(11670)

0 ~120 ms α

200 ~80 us α

(5300) Sn

277 112112

Q_α11820

0.24 ms α