 Directory: /scratch/ambrose/asdqtest/oct27/

   S Q C phi slt rpt cr sl i tdcn
   - - --- --- --- --- -- -- - ----
   6 C 240 228 088 500 07 15 0 SWB2
   6 C 242 228 088 501 07 15 1 SWB2
   6 C 244 228 088 502 07 15 2 SWB2
   6 C 246 228 088 503 07 15 3 SWB2

 DTH scan: 170-700 mV, 10 mV steps (54 points)

 Ranges: TIM WID ATN QEN DTH OSC

   min: 434.0 30.1 18.7 22.0 480 190
   max: 443.7 36.2 23.7 27.2 590 480
   avg: 439.7 32.6 21.0 24.3 527 196

 Cell summary:

   SL6-240 (C,500,07-15-0): OKAY
   SL6-241 (C,500,07-15-0): OKAY
   SL6-242 (C,501,07-15-1): OKAY
   SL6-243 (C,501,07-15-1): OKAY
   SL6-244 (C,502,07-15-2): OKAY
   SL6-245 (C,502,07-15-2): OKAY
   SL6-246 (C,503,07-15-3): OKAY
   SL6-247 (C,503,07-15-3): OKAY

Wire summary:

   SL6-244 (C,502,07-15-2): #03/51 N = 1.000 (1.000,0.001,0.034,1.038)
   SL6-244 (C,502,07-15-2): #05/53 N = 1.000 (1.000,0.000,0.011,0.995)
   SL6-244 (C,502,07-15-2): #06/54 N = 1.000 (1.000,0.001,0.040,0.929)
   SL6-244 (C,502,07-15-2): #07/55 N = 1.000 (1.000,0.000,0.012,0.847)
   SL6-244 (C,502,07-15-2): #08/56 N = 1.000 (1.000,0.000,0.015,0.945)
   SL6-244 (C,502,07-15-2): #10/58 N = 1.000 (1.000,0.001,0.013,1.011)
   SL6-245 (C,502,07-15-2): #02/62 N = 1.000 (1.000,0.000,0.021,0.962)
   SL6-245 (C,502,07-15-2): #03/63 N = 1.000 (1.000,0.001,0.021,0.973)
   SL6-245 (C,502,07-15-2): #05/65 N = 1.000 (1.000,0.006,0.042,1.022)
   SL6-245 (C,502,07-15-2): #06/66 N = 1.000 (1.000,0.009,0.040,1.033)
   SL6-245 (C,502,07-15-2): #07/67 N = 1.000 (1.032,0.000,0.007,1.071)
   SL6-245 (C,502,07-15-2): #08/68 N = 1.000 (1.000,0.011,0.041,1.033)
   SL6-245 (C,502,07-15-2): #09/69 N = 1.000 (1.000,0.002,0.013,0.973)
   SL6-245 (C,502,07-15-2): #10/70 N = 1.000 (1.000,0.001,0.039,0.962)