Module Connector Count

Card Type Acronym # board spares prototype total Connector type per brd J3 Transition card conn per brd front Institution

& teststand #board J1/J2 J0 J3 #pin TJ0 TJ2 TJ2S TJ3 panel

Global Cards

CPU Adaptor card 112 20 50 182 2 1 - 182 FNAL

TRACER 111 20 12 143 2 1 - 143 FNAL

Central

ADMEM ADMEM 224 45 24 293 2 1 1 160 - 1 1 293 FNAL

CALIB CCAL 25 4 2 31 2 1 - - - - 31 Penn

Hadron ASD 75 10 4 89 2 - 1 160 - 1 1 89 Frascatti

CMU ASD 48 5 4 57 2 - 1 160 - 1 1 57 Illinois

SMX Readout SMXR 72 8 4 84 2 - 1 160 - 1 1 84 FNAL

TDC

COT & HAD TDC (LVDS) 331 47 20 398 2 1 1 220 1 1 1 796 Michigan

Muon TDC (ECL) 107 20 15 142 2 1 1 220 1 1 1 284 Michigan

Level 1

Digital Receive & Compare DIRAC 96 20 15 131 2 1 1 220 1 1 1 262 Chicago

L1 Crate Sum 12 4 2 18 2 1 1 220 18 Chicago

Muon Pre-Fred 1 1 2 4 2 1 1 220 4 Chicago

Tower Trigger Pre-Fred 1 1 1 3 2 1 1 220 3 Chicago

Track Trigger Pre-Fred 1 1 1 3 2 1 1 220 3 Chicago

Et Pre-Fred 1 1 1 3 2 1 1 220 3 Chicago

FRED FRED 1 1 2 4 2 1 1 220 4 Yale

Level 2

Digital Clusterfinder DCAS 72 15 8 95 2 1 1 220 95 Michigan

Local Control and Sum LOCOS 6 2 2 10 2 1 1 220 10 Michigan

Neural Net Pick ISOPICK 6 2 2 10 2 1 1 220 10 Michigan

Cluster Queen CLIQUE 2 2 2 6 2 1 1 220 6 Michigan

Isocluster Queen ISOCLIQUE 1 1 1 3 2 1 1 220 3 Michigan

L2 Processor ALPHA 6 2 2 10 2 1 1 220 10 Michigan

L2 SVT 1 1 2 4 2 1 1 220 4 Michigan

L2 Track 1 1 1 3 2 1 1 220 3 Michigan

L2 Muon 1 1 1 3 2 1 1 220 3 Michigan

L2 XCES 1 1 1 3 2 1 1 220 3 ANL

L2 Timing Control 1 1 1 3 2 1 1 220 3 Michigan

Muon Trigger

Muon Match 12 4 4 20 2 1 1 220 1 1 1 40 Michigan

Muon Pre-Match 4 2 1 7 2 1 1 220 1 1 1 14 Michigan

Module Connector Count

Card Type Acronym # board spares prototype total Connector type per brd J3 Transition card conn per brd front Institution

& teststand #board J1/J2 J0 J3 #pin TJ0 TJ2 TJ2S TJ3 panel

Trigger Summary Card 1 1 1 3 2 1 1 220 1 1 1 6 Michigan

XFT

XFT Finder XFTF 48 10 8 66 2 1 1 220 1 1 1 132 FNAL

XFT Linker XFTL 24 6 4 34 2 1 1 220 1 1 1 68 OSU

XTRP

XTRP Data 24 6 4 34 2 1 1 220 1 1 1 68 Illinois

XTRP Clock 2 1 2 5 2 1 1 220 5 Illinois

XTRP Bus-Boss 2 1 1 4 2 1 1 220 4 Illinois

SVX Trigger (SVT)

AM Board 24 5 6 35 2 1 1 160 35 PISA

AM Sequencer AMS 12 2 2 16 2 1 1 160 16 PISA

Hit Buffer 20 4 3 27 2 1 1 160 27 PISA

SVT Merger 20 4 3 27 2 1 1 160 27 PISA

SVT Hit Finder 36 8 4 48 2 1 1 235 48 Chicago

SVT Track Fitter 12 3 2 17 2 1 1 160 17 Chicago

DAQ Readout

DAQ TAXI Transition DTTM 14 4 4 22 235 1 1 22 FNAL

TSI & X-points

Trigger Supervisor TSI 10 2 3 15 2 1 15 Yale

Trigger X-point TXPT 16 4 4 24 2 1 24 Yale

Done-Error-Busy X-point DXPT 6 4 2 12 2 1 12 Yale

Done Fan-In 3 1 1 5 2 1 5 Yale