GMT Oct 22 13:19 SCIGN Radome Prototypes

0˚ 60˚ 120˚ 180˚ 240˚ 300˚ 0˚

-30˚ 0˚ 30˚ 60˚ 90˚

-0.6

-0.6

-0.4

-0.2

00.2

0.40.6

0.6

0.6

0.8

0.8

1

1

1.2

1.2

1.2

Radome Prototype B (mm)

measurements by J. Galetzka

Top View of Dome B (mm)

0˚ 60˚ 120˚ 180˚ 240˚ 300˚ 0˚

-30˚ 0˚ 30˚ 60˚ 90˚

0.2

0.2

0.4

0.4

0.40.6

0.6

0.8

1

Radome Prototype A (mm)

measurements by F. Wyatt

Top View of Dome A (mm)

0˚

30˚

60˚

90˚

120˚

150˚

180˚

210˚

240˚

270˚

300˚

330˚

0.2

0.2

0.2

0.2

0.2

0.4

0.4

0.4

0.4

0.4

0.4

0.4

0.6

0.6

0.6

0.6

0.6

0.6

0.6

0.6

0.8

0.8

0.8

0.8

0.8

1

1

1

0˚

30˚

60˚

90˚

120˚

150˚

180˚

210˚

240˚

270˚

300˚

330˚

-0.4

-0.4

-0.4

-0.4

-0.4

-0.4

-0.4

-0.2

-0.2

-0.2

-0.2

-0.2

-0.2

-0.2

-0.2

0

0

0

0

0

0

0.2

0.2

0.2

0.2

0.2

0.2

0.2

0.4

0.4

0.4

0.4

0.4

0.4

0.4

0.6

0.6

0.6

0.6

0.6

0.6

0.6

0.6

0.6

0.8

0.8

0.8

0.8

0.8

0.8

0.8

1

1

1

1

1

1

1

1

1

1.2

1.2

1.2

1.2

1.2

1.2