The LBLnet Services Group

Appletalk and Fastpath Notes

are used for automatic assignment by the FastPaths.

Subnet Notes

128.3.0.0 and 131.243.0.0.

field to a 10-bit host field. The upper quarter of the space in expanded subnets

Configuration Protocol) automatic assignment blocks in the future.

128.3 SUBNETS

                                default
Subnet          network mask    gateway         use
_________       ______________  ____________    ______________
128.3.1.........255.255.255.0...128.3.1.1.......Building 50D (CCSE)
128.3.2.........255.255.255.0...128.3.2.1.......Building 50B-floors 4/5/6 (Comp.Directorate/Physics/Library)
128.3.3.........255.255.255.0...128.3.3.1.......Building 50E (CNR/Physics/NSD/OPS)
128.3.5.........255.255.255.0...128.3.5.1.......Building 50A-floors 1/2 (NSD/Physics)
128.3.6.........255.255.255.0...128.3.6.1.......Building 50F (Computing/TEID)
128.3.7.........255.255.255.0...128.3.7.1.......Building 50B-2265 (Computing Room)
128.3.9.........255.255.255.0...128.3.9.1.......Building 50A-floor 3/50C (ESnet/Par. Apple./User Srvcs.)
128.3.10........255.255.254.0...128.3.11.1......Building 50B-floors 1/2/3 (Computing/Graphics Lab)
128.3.11........255.255.254.0...128.3.11.1......Building 50B-floors 1/2/3 (Computing/Graphics Lab)
128.3.12........255.255.252.0...128.3.12.1......Building 90
128.3.13........255.255.252.0...128.3.12.1......Building 90 (part of 128.3.12)
128.3.14........255.255.252.0...128.3.12.1......Building 90 (part of 128.3.12)
128.3.15........255.255.252.0...128.3.12.1......Building 90 (part of 128.3.12) Reserved for net use
128.3.16........255.255.255.0...128.3.16.1......Building 50B Bill Saphir IBM Cluster 50B-2265
128.3.20........255.255.252.0...128.3.20.1......Building 90 (same as 128.3.12)
128.3.21........255.255.252.0...128.3.20.1......Building 90 (part of 128.3.20)
128.3.22........255.255.252.0...128.3.20.1......Building 90 (part of 128.3.20)
128.3.23........255.255.252.0...128.3.20.1......Building 90 (part of 128.3.20)
128.3.24........255.255.255.0...128.3.24.1......Building 941 (Center Street Building)
128.3.25........255.255.255.0...128.3.25.1......Building 943 Oakland (Unix)
128.3.26........255.255.255.0...128.3.26.1......Building 943 Oakland (Backup)
128.3.27........255.255.255.0...128.3.27.1......Building 943 Oakland (test)
128.3.28........255.255.255.0...128.3.28.1......Building 50A-2109 (PDSF)
128.3.29........255.255.255.0...128.3.29.1......Building 943 Oakland (Office Subnet)
128.3.32........255.255.252.0...128.3.34.146....Bridged Subnet (same as 128.3.252)
128.3.33........255.255.252.0...128.3.34.146....Bridged Subnet (part of 128.3.32)
128.3.34........255.255.252.0...128.3.34.146....Bridged Subnet (part of 128.3.32)
128.3.35........255.255.252.0...128.3.34.146....Bridged Subnet (part of 128.3.32) Reserved for net use
128.3.36........255.255.252.0...128.3.36.1......LANmark LN1,LN2 for FastPaths and hosts
128.3.37........255.255.252.0...128.3.36.1......LANmark LN1,LN2 (part of 128.3.36)
128.3.38........255.255.252.0...128.3.36.1......LANmark LN1,LN2 (part of 128.3.36)
128.3.39........255.255.252.0...128.3.36.1......LANmark LN1,LN2 (part of 128.3.36)
128.3.41........255.255.255.0...128.3.41.1......CITG Grp. IMAP4 Production Servers
128.3.42........255.255.255.240.................CITG Grp. BIG IP Project
128.3.44........255.255.255.0...................Building 88 Gammasphere Project
128.3.48........255.255.255.0...................Building 77 switched, Building 31
128.3.52........................................EECAD, Building 50B - not routed, local use only
128.3.68........................................FastPath, b70-dps.lbl.gov
128.3.76........255.255.254.0...128.3.76.1......Bldg 90 Trailers
128.3.77........255.255.254.0...128.3.76.1......Bldg 90 Trailers (part of 128.3.76)
128.3.83........255.255.255.0...128.3.83.1......temporary Marriott conference subnet 1/2002
128.3.116.......................................Reserved
128.3.120.......................................Misc. small subnets, various subnet sizes
128.3.120.......255.255.255.240.................Gammasphere Multicast
128.3.128.......255.255.252.0...128.3.128.1.....Buildings 46/47/58 Complex
128.3.129.......255.255.252.0...128.3.128.1.....Buildings 46/47/58 Complex (part of 128.3.128)
128.3.130.......255.255.252.0...128.3.128.1.....Buildings 46/47/58 Complex (part of 128.3.128)

128.3.131.......255.255.252.0...128.3.128.1.....Buildings 46/47/58 Complex (part of 128.3.128)
128.3.132.......255.255.255.0...128.3.132.1.....Buildings 4/5/25/25A/44A/44B
128.3.140.......255.255.252.0...128.3.140.2.....CSR - Bldg 50 complex
128.3.141.......255.255.252.0...128.3.140.2.....CSR - Bldg 50 complex (part of 128.3.140)
128.3.142.......255.255.252.0...128.3.140.2.....CSR - Bldg 50 complex (part of 128.3.140)
128.3.143.......255.255.252.0...128.3.140.2.....CSR - Bldg 50 complex (part of 128.3.140) - Reserved for net use
128.3.152.......255.255.255.0...................Testing (DHCP) Powers/Rosenberg
128.3.164.......................................Resmed NMR, Building 55 - Mark S. Roos
128.3.168.......................................Net Experiments - Ted Sopher
128.3.176.......................................Point to point pseudo-net
128.3.180.......255.255.252.0...128.3.180.1.....Buildings 70/70A/
128.3.181.......255.255.252.0...128.3.180.1.....Buildings 70/70A/ (part of 128.3.180)
128.3.182.......255.255.252.0...128.3.180.1.....Buildings 70/70A/ (part of 128.3.180)
128.3.183.......255.255.252.0...128.3.180.1.....Buildings 70/70A/ (part of 128.3.180) - Reserved for net use
128.3.196.......255.255.252.0...128.3.196.10....Building 50B (used to be called the Adv. Dev. subnet)
128.3.197.......255.255.252.0...128.3.196.10....Building 50B (part of 128.3.196)
128.3.198.......255.255.252.0...128.3.196.10....Building 50B (part of 128.3.196)
128.3.199.......255.255.252.0...128.3.196.10....Building 50B (part of 128.3.196) - Reserved for net use
128.3.224.......255.255.252.0...................FDDI TP-PMD Trials, Bldg. 50B - Bill Johnston
128.3.240.......................................Physics VME, 50A-2156
128.3.252.......255.255.252.0...128.3.254.146...Bridged Subnet (same as 128.3.32)
128.3.253.......255.255.252.0...128.3.254.146...Bridged Subnet (part of 128.3.252)
128.3.254.......255.255.252.0...128.3.254.146...Bridged Subnet (part of 128.3.252)
128.3.255.......255.255.252.0...128.3.254.146...Bridged Subnet (part of 128.3.252) Reserved for net use

131.243 SUBNETS

                                default
Subnet          network mask    gateway         use
_________       ______________  ____________    ______________
131.243.1.......255.255.255.0...131.243.1.1     Network Research Group
131.243.2.......255.255.255.0...131.243.2.1     Imaging and Distributed Computing Group
131.243.3.......255.255.255.0...131.243.3.1     Bldg. 72C
131.243.6.......(assigned by LBLnet staff)......ISDN subnets with 4-bit host field
131.243.7.......(assigned by LBLnet staff)......ISDN subnets with 3-bit host field
131.243.8.......................................Leuschner Observatory in Lafayette hills
131.243.9.......255.255.255.0...131.243.9.1.....DHCP Service
131.243.10......255.255.255.0...131.243.10.1....Bldg. 55
131.243.11......255.255.255.0...131.243.11.1....Bldg. 75 Backup Facility
131.243.12......255.255.252.0...131.243.12.1....Bldgs. 62 (New Subnet)
131.243.13......255.255.252.0...131.243.12.1....Bldgs. 62
131.243.14......255.255.252.0...131.243.12.1....Bldgs. 62
131.243.15......255.255.252.0...131.243.12.1....Bldgs. 62
131.243.16......255.255.252.0...131.243.16.1....Bldgs. 62/66/72
131.243.17......255.255.252.0...131.243.16.1....Bldgs. 62/66/72 (part of 131.243.16)
131.243.18......255.255.252.0...131.243.16.1....Bldgs. 62/66/72 (part of 131.243.16)
131.243.19......255.255.252.0...131.243.16.1....Bldgs. 62/66/72 (part of 131.243.16) Rserved for net use
131.243.20......255.255.255.0...131.243.20.1....ISDN testing and Remote Conferences
131.243.21......255.255.255.248.131.243.218.49..ISDN Remote Services
131.243.24......255.255.255.0...131.243.24.1... RAS testing
131.243.32......255.255.252.0...131.243.32.1....Donner/Stanley/Hildebrand
131.243.33......255.255.252.0...131.243.32.1....Donner/Stanley/Hildebrand (part of 131.243.32)
131.243.34......255.255.252.0...131.243.32.1....Donner/Stanley/Hildebrand (part of 131.243.32)
131.243.35......255.255.252.0...131.243.32.1....Donner/Stanley/Hildebrand  Part of the DHCP Scope Range
131.243.36......255.255.255.0...131.243.36.1....Building 51
131.243.40......255.255.252.0...131.243.40.1....User FDDI
131.243.41......255.255.252.0...131.243.40.1....User FDDI (part of 131.243.40)
131.243.42......255.255.252.0...131.243.40.1....User FDDI (part of 131.243.40)
131.243.43......255.255.252.0...131.243.40.1....User FDDI (part of 131.243.40) Reserved for net use
131.243.44......255.255.252.0...131.243.44.1....R&D ATM (operated by ITG/DCG group)
131.243.45......255.255.252.0...131.243.44.1....R&D ATM (part of 131.243.44)
131.243.46......255.255.252.0...131.243.44.1....R&D ATM (part of 131.243.44)
131.243.47......255.255.252.0...131.243.44.1....R&D ATM (part of 131.243.44) Reserved for net use
131.243.48......255.255.252.0...131.243.48.1....Bldg. 50
131.243.49......255.255.252.0...131.243.48.1....Bldg. 50 (part of 131.243.48)
131.243.50......255.255.252.0...131.243.48.1....Bldg. 50 (part of 131.243.48)
131.243.51......255.255.252.0...131.243.48.1....Bldg. 50 (part of 131.243.48) Reserved for net use
131.243.52......255.255.255.0...131.243.52.1....Bldg. 3 Calvin Lab.
131.243.55......255.255.255.0...131.243.55.1....Bldg. 50B-2215 only for private experimental use.  Chuck McParland
131.243.56......255.255.252.0...131.243.56.1....Bldg. 84
131.243.57......255.255.252.0...131.243.56.1....Bldg. 84 (part of 131.243.56)
131.243.58......255.255.252.0...131.243.56.1....Bldg. 84 (part of 131.243.56)
131.243.59......255.255.252.0...131.243.56.1....Bldg. 84 (part of 131.243.56) Part of the DHCP Scope Range
131.243.60......255.255.255.0...131.243.60.1....50B-2265
131.243.64......255.255.252.0...131.243.64.1....Bldg. 50B
131.243.65......255.255.252.0...131.243.64.1....Bldg. 50B (part of 131.243.64)
131.243.66......255.255.252.0...131.243.64.1....Bldg. 50B (part of 131.243.64)
131.243.67......255.255.252.0...131.243.64.1....Bldg. 50B (part of 131.243.64) Reserved for net use
131.243.70......255.255.255.0...131.243.70.1....Bldgs. ALS, 10, 80
131.243.71......255.255.255.0...131.243.71.1....ALS Control
131.243.72......255.255.255.0...131.243.72.1....ALS Beamline 6
131.243.73......255.255.255.0...131.243.73.1....ALS Beamline 7
131.243.74......255.255.255.0...131.243.74.1....ALS Beamline 8
131.243.75......255.255.255.0...131.243.75.1....ALS Beamline 9
131.243.76......255.255.255.0...131.243.76.1....ALS Beamline 10
131.243.77......255.255.255.0...131.243.77.1....ALS Beamline 11
131.243.78......255.255.255.0...131.243.78.1....ALS Beamline 12
131.243.79......255.255.255.0...131.243.79.1....ALS Beamline 5
131.243.80......................................reserved for ALS
131.243.81......................................reserved for ALS
131.243.82......................................reserved for ALS
131.243.83......255.255.255.0...131.243.83.1....ALS Beamline 4
131.243.84... ..255.255.255.0...131.243.84.1....ALS Control #2
131.243.85......255.255.255.0...131.243.85.1....ALS Mezzanine
131.243.86......255.255.255.0...131.243.86.1....TP-PMD FDDI Trials - Bill Johnston
131.243.87......255.255.255.0...131.243.87.1....Fast Feed Back Subnet
131.243.88......255.255.255.0...131.243.88.1....ALS Mezzanine Part 2
131.243.92......255.255.255.0...131.243.92.1....Bldg. 10
131.243.96......255.255.252.0...131.243.96.1....Bldgs. 7/16/76
131.243.97......255.255.252.0...131.243.96.1....Bldgs. 7/16/76 (part of 131.243.96)
131.243.98......255.255.252.0...131.243.96.1....Bldgs. 7/16/76 (part of 131.243.96)
131.243.99......255.255.252.0...131.243.96.1....Bldgs. 7/16/76 (part of 131.243.96) Reserved for net use
131.243.112.....255.255.252.0...131.243.112.1...Bldgs. 50A
131.243.113.....255.255.252.0...131.243.112.1...Bldgs. 50A (part of 131.243.112)
131.243.114.....255.255.252.0...131.243.112.1...Bldgs. 50A (part of 131.243.112)
131.243.115.....255.255.252.0...131.243.112.1...Bldgs. 50A (part of 131.243.112) Reserved for net use
131.243.120.....255.255.255.0...131.243.120.1...Bldg.  14