0

500 1000

2000

3000

4000

5000

6000

8000

10000

12000

16000

20000

24000

28000

32000

36000

40000

44000

48000

52000

56000

60000

64000

68000

72000

100

A=168

NDS 53, 223(1988) NDS 71, 261(1994)(U)

Evaluator: V.S. Shirley

168 64Gd

Q_{β−}(4400)

0+

(5500) Sn

(11700) Sp

168 65Tb

Q_{β−}(6000)

(4700) Sn

(9100) Sp

168 66Dy

Q_{β−}(1600)

0+ 8.7 m β−

(6600) Sn

(9900) Sp

168 67Ho

Q_{β−}2910

0 3+ 2.99 m β−

59 (6+) 132 s

IT>99.5% β−^{<0.5%}

5860 Sn 7430 Sp

168 68Er 0+

7771.07 Sn 7995 Sp

168 69Tm

Q_{β−}257

3(+) 93.1 d β− 0.010%

Q_{EC}1679.1

EC 99.990%

5309.6 Sp 6840.3 Sn

168 70Yb 0+

6315 Sp 9052 Sn

168 71Lu

Q_{EC}4480

0 (6^–)

5.5 m EC

220 3+ 6.7 m EC

>95%

IT<5%

3790 Sp

7710 Sn

168 72Hf

Q_{EC}(1800)

0+ 25.95 m EC

(5130) Sp

(9910) Sn

168 73Ta

Q_{EC}(6700)

(3+) 2.0 m EC

(2500) Sp

(8200) Sn

168 74W

Q_{EC}(3800)

0+ 51 s EC

Q_α4506

α 0.0027%

(3700) Sp

(10700) Sn

172 76Os

Q_α5227

0+ 19.2 s

α 0.2%

168 75Re

Q_{EC}(9100)

(6+) 4.4 s EC ~100%

Q_α5063

α ~5×10^{-3}%

(800) Sp

(9000) Sn

172 77Ir

Q_α5991

0 (3+)

4.4 s

α 2%

139 (7+)

2.0 s

α 23%

168 76Os

Q_{EC}(5800)

0+ 2.2 s

EC_{51%}

Q_α5818

α 49%

(2380) Sp

(11500) Sn

172 78Pt

Q_α6465

0+ 0.104 s

α ~94%

168 77Ir

Q_{EC}(11300) Q_p(500) Q_α(6560)

α ~94%

(9500) Sn

172 79Au

Q_α7020

4 ms

α

168 78Pt

Q_{EC}(7520)

0+

Q_α6991 α

(1200) Sp