slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0 20 40 60 80 100 120 140 160 180 200 220 Eta bin=4

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0 20 40 60 80 100 120 140 160 180 200 220 Eta bin=5

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0

50

100

150

200

250

300 Eta bin=6

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0 50 100 150 200 250 300 350 400 450 Eta bin=7

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0 20 40 60 80 100 120 140 160 180 200 220 240 Eta bin=8

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0

50

100

150

200

250 Eta bin=9

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0 50 100 150 200 250 300 350 400

Eta bin=10

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0 50 100 150 200 250 300 350 400 450 Eta bin=11

slope (Jan)

-0.3 -0.25 -0.2 -0.15 -0.1 -0.05

Laser (Renee)

0 50 100 150 200 250 300 350

Eta bin=12