Your search turned up 135 hits.

Date Instrument Mode

Available Plots

Data Quality

Magnetic Field Science Comments Problems/Other 07/01/97 M P poor, noB none Low fluxes. Corrupted B. 07/02/97 M P poor, noB none Low fluxes. Corrupted B. 07/03/97 M P poor, noB none Low fluxes. Corrupted B. 07/04/97 M P poor, noB none Low fluxes. Corrupted B. 07/05/97 M P poor, noB none Low fluxes. Corrupted B. 07/06/97 M P poor, noB none Low fluxes. Corrupted B. 07/07/97 M P poor, noB none Low fluxes. Corrupted B. 07/08/97 M P poor, noB none Low fluxes. Corrupted B. 07/09/97 M P poor, noB none Low fluxes. Corrupted B. 07/10/97 M P poor, noB none Low fluxes. Corrupted B. 07/11/97 M P poor, noB none Low fluxes. Corrupted B. 07/12/97 M P poor, noB none Low fluxes. Corrupted B. 07/13/97 M P poor, noB none Low fluxes. Corrupted B. 07/14/97 M P poor, noB none Low fluxes. Corrupted B. 07/15/97 M P poor, noB none Low fluxes. Corrupted B. 07/16/97 M P poor, noB none Low fluxes. Corrupted B. 07/17/97 M P poor, noB none Low fluxes. Corrupted B. 07/18/97 M P poor, noB none Low fluxes. Corrupted B. 07/19/97 M P poor, noB none Low fluxes. Corrupted B.

07/20/97 M P poor, noB none Low fluxes. Corrupted B. 07/21/97 M P poor, noB none Low fluxes. Corrupted B. 07/22/97 M P poor, noB none Low fluxes. Corrupted B. 07/23/97 M P poor, noB none Low fluxes. Corrupted B. 07/24/97 M P poor, noB none Low fluxes. Corrupted B. 07/25/97 M P poor, noB none Low fluxes. Corrupted B. 07/26/97 M P poor, noB none Low fluxes. Corrupted B. 07/27/97 M P poor, noB none Low fluxes. Corrupted B. 07/28/97 M P poor, noB none Low fluxes. Corrupted B. 07/29/97 M P poor, noB none Low fluxes. Corrupted B. 07/30/97 M P poor, noB none Low fluxes. Corrupted B. 07/31/97 M P poor, noB none Low fluxes. Corrupted B. 08/01/97 M P poor, noB none Low fluxes. Corrupted B. 08/02/97 M P poor, noB none Low fluxes. Corrupted B. 08/03/97 M P poor, noB none Low fluxes. Corrupted B. 08/04/97 M P poor, noB none Low fluxes. Corrupted B. 08/05/97 M P poor, noB none Low fluxes. Corrupted B. 08/06/97 M P poor, noB none Low fluxes. Corrupted B. 08/07/97 M P poor, noB none Low fluxes. Corrupted B. Datagap late in the day? 08/08/97 M P poor, noB none Low fluxes. Corrupted B. 08/09/97 M P good low res. Low fluxes. Flux gap inprotons?

08/10/97 M P good low res. Low fluxes. Flux gap inprotons? 08/11/97 M P good low res. Low fluxes. Flux gap inprotons? 08/12/97 M P good low res. Low fluxes. Flux gap inprotons? 08/13/97 M P good low res. Low fluxes. Flux gap inprotons? 08/14/97 M P good low res. Low fluxes. Flux gap inprotons? 08/15/97 M P n/a n/a > Empty plot. 08/16/97 M P n/a n/a > Empty plot. 08/17/97 M P n/a n/a > Empty plot. 08/18/97 M P n/a n/a > Empty plot. 08/19/97 M P n/a n/a > Empty plot. 08/20/97 M P n/a n/a > Empty plot. 08/21/97 M P poor, noB none Low fluxes. Corrupted B. 08/22/97 M P poor, noB none Low fluxes. Corrupted B. 08/23/97 M P poor, noB none Low fluxes. Corrupted B. 08/24/97 M P poor, noB none Low fluxes. Corrupted B. 08/25/97 M P poor, noB none Low fluxes. Corrupted B. 08/26/97 M P poor, noB none Low fluxes. Corrupted B. 08/27/97 M P poor, noB none Low fluxes. Corrupted B. 08/28/97 M P poor, noB none Low fluxes. Corrupted B. 08/29/97 M P poor, noB none Low fluxes. Corrupted B.

08/30/97 M P poor, noB none

Increased fluxes in polar cap. Instrument potentially perp B for extended times. Low fluxes elsewhere.

Corrupted B. B is also drifting in time.

08/31/97 M P poor, noB none Low fluxes. Corrupted B.

09/01/97 M P poor, noB none Low fluxes. Corrupted B. 09/02/97 M P poor, noB none Low fluxes. Corrupted B. 09/03/97 M P poor, noB none Low fluxes. Corrupted B. 09/04/97 M P poor, noB none Very low fluxes. Corrupted B. 09/05/97 M P poor, noB none Very low fluxes. Proton asymmetry. Corrupted B.

09/06/97 M P poor, noB none Very low fluxes. Corrupted B. 09/07/97 M P poor, noB none Very low fluxes. Corrupted B. 09/08/97 M P poor, noB none Very low fluxes. Proton asymmetry. Corrupted B.

09/09/97 M P poor, noB none Very low fluxes. Corrupted B. 09/10/97 M P good low res. Low fluxes. Proton asymmetry.

Flux gap in proton detectors?!

09/11/97 M P good low res. Low fluxes in radiation belts.

Generally noisy. Gap in counts of proton detector!?

09/12/97 M P good low res. Low fluxes in radiation belts. Generally noisy.

09/13/97 M P good low res. Low fluxes in radiation belts. Generally noisy.

09/14/97 M P poor, noB none Asymmetries. Corrupted B. 09/15/97 M P poor, noB none > Corrupted B. 09/16/97 M P poor, noB none Asymmetries. Corrupted B. 09/17/97 M P poor, noB none Asymmetries. Corrupted B. 09/18/97 M P poor, noB none > Corrupted B. 09/19/97 M P poor, noB none Asymmetries. Corrupted B. 09/20/97 M P poor, noB none Asymmetries. Corrupted B.

09/21/97 M P poor, noB none > Corrupted B. 09/22/97 M P poor, noB none > Corrupted B. 09/23/97 M P poor, noB none Asymmetries. Corrupted B. 09/24/97 M P poor, noB none Asymmetries. Corrupted B. 09/25/97 M P poor, noB none > Corrupted B. 09/26/97 M P poor, noB none Asymmetries. Corrupted B. 09/27/97 M P poor, noB none Loss cones evident. Asymmetries. Corrupted B.

09/28/97 M P poor, noB none Loss cones evident. Corrupted B. 09/29/97 M P poor, noB none Loss cones evident. Corrupted B. 09/30/97 M P poor, noB none High electron fluxes. Corrupted B. Nadirp+ timing off. 10/01/97 M P poor, noB none > Corrupted B. 10/02/97 M P poor, noB none High electron fluxes (perp B?). Corrupted B.

10/03/97 M P poor, noB none Loss cones evident. Corrupted B. 10/04/97 M P poor, noB none

Asymmetries. High electron fluxes (perp B?).

Corrupted B.

10/05/97 M P poor, noB none

Asymmetries. High electron fluxes (perp B?).

Corrupted B.

10/06/97 M P n/a n/a > Empty plot. 10/07/97 M P poor, noB none

Asymmetries. High electron fluxes (perp B?).

Corrupted B.

10/08/97 M P poor, noB none > Corrupted B. 10/09/97 M P poor, noB none Short flux peaks in polar cap. Corrupted B.

10/10/97 M P poor, noB none Short flux peaks in polar cap. Corrupted B.

10/11/97 M P poor, noB none Short flux peaks in polar cap.

Corrupted B. Timimg of all channels questionable.

10/12/97 M P poor, noB none Short flux peaks in polar cap. Corrupted B.

10/13/97 M P poor, noB none > Corrupted B.

10/14/97 M P n/a n/a > Empty plot. 10/15/97 M P n/a n/a > Empty plot.

10/16/97 M P good low res.

Good loss cones.Pronounced electron asymmetry.

Noisy Nad e-.

10/17/97 M P good low res. Good loss cones. Noisy Nad e-. 10/18/97 M P good low res. Deep proton loss cones. Noisy Nad e-.

10/19/97 M P good low res. High electron fluxes perp to B (>10^4). Noisy Nad e-.

10/20/97 M P good low res. Good protin loss cones.

Noisy Nad e-. Time axis of electrons is off.

10/21/97 M P good low res. Deep loss cones. Noisy Nad e-.

10/22/97 M P good low res. High electron fluxes perp to B (>10^4). Noisy Nad e-.

10/23/97 M P good low res.

Proton asummetry. High electron fluxes (short peaks).

Noisy Nad e-.

10/25/97 M P good/fair low res. Goor p+ loss cone. Proton asymmetry.

Large data gaps in Nad e- data.

10/26/97 M P fair low res. Brief high Zen e- flux.

Many dropouts and large data gaps. Time axis in Zen ewrong.

10/27/97 M P good low res. Good loss cones. Noisy Nad e-.Dropout in Nad p+.

10/27/97 M P good low res. Good loss cones. Noisy Nad e-.

10/28/97 M P good low res. Electron and proton asymmetry. Noisy Nad e-.

10/29/97 M P good low res. Electron and proton asymmetry. Noisy Nad e-.

10/30/97 M P good low res. Electron asymmetry. Noisy Nad e-. 10/31/97 M P good low res. Good loss cones. Noisy Nad e-.

11/01/97 M P good low res. Good loss cones. Electron asymmetry. Noisy Nad e-.

11/02/97 M P good low res. Deep loss cones. Noisy Nad e-. 11/03/97 M P good low res. Good loss cones. Noisy Nad e-.

11/04/97 M P good low res.

Solar Energetic Proton (SEPS) event with enhanced counts due to 100 MeV protons. Much weaker than 06 Oct 1997.

Noisy Nad e-.

11/05/97 M P good low res.

Good loss cones. Anisotropic proton fluxes in radiation belts.

Noisy Nad e-.

11/06/97 M P excellent low res.

Solar energetiv Proton (SEP) event, high background of 100 MeV protons causes background counts to increase by a factor of 100.

Noisy Nad e-.

11/07/97 M P good low res. High 100 MeV proton (SEP) background. Noisy Nad e-.

11/08/97 M P good low res.

Decaying 100 MeV proton (SEP) background. Beam in Zen e- near B?

Noisy Nad e-.

11/09/97 M P good low res.

High counts. Decaying 100 MeV proton baackground, highest in Zen e-.

Noisy Nad e-.

11/10/97 M P good low res. High counts. Noisy Nad e-.

11/11/97 M P good low res. High counts. Some easymmetry. Noisy Nad e-.

11/12/97 M P good low res. Good loss cones. Noisy Nad e-.