Survey Number: NAV9366B
Format Acronymn: ARO8
NGDC File Number: 0540-002
Params: FXD  
Data Rec'd @NGDC (YYMMDD): 931118
Contributing Institution: US Naval Oceanographic Office           
Country: USA               
Platform Name: RP-3D Orion         
Code: 3
Platform Type: PLANE 
Chief Scientist(s): Jesus Anglero, Don Wilson      
Project: Projct Magnet A32-154; Cape Flattery, Washington; 9.6 Flight Hours            
Start Date (YYMMDD): 810807
Survey Departure Airport: Whidbey Island, Washington, USA  
End Date (YYMMDD): 810808
Survey Arrival Airport: Whidbey Island, Washington, USA
Flight Line Spacings: East-West: 10 Nautical Miles            
Magnetometor(s) Used: Honeywell Flux-Gate Vector            
Aircraft Altitude: 500 Feet Barometric 
Aircraft Velocity: 240 Knots     
Sampling Rates Per Second:   4
Sensor Tow Distance:        
Reference Field:              
Total Observations:      23566
Magnetometor Sensitivity:      1.0 nT
Bounding Limits:
Top Latitude   : +50
Bottom Latitude: +49
Left Longitude : -131
Right Longitude: -126
                                                                             
Altitude Field set equal to 500.                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
