Survey Number: NAV9414B
Format Acronymn: ARO8
NGDC File Number: 0540-012
Params: FXD  
Data Rec'd @NGDC (YYMMDD): 931118
Contributing Institution: US Naval Oceanographic Office           
Country: USA               
Platform Name: RP-3D Orion         
Code: 3
Platform Type: PLANE 
Chief Scientist(s): Jesus Anglero & Don Wilson     
Project: Project Magnet A32-154; Cape Flattery, Washington; 10.9 Flight Hours          
Start Date (YYMMDD): 810814
Survey Departure Airport: Whidbey Island, Washington, USA  
End Date (YYMMDD): 810815
Survey Arrival Airport: Whidbey Island, Washington, USA
Flight Line Spacings: East-West: 10 Nautical Miles            
Magnetometor(s) Used: Honeywell Flux-Gate Vector            
Aircraft Altitude: 500 Feet Barometric 
Aircraft Velocity: 240 Knots     
Sampling Rates Per Second:   4
Sensor Tow Distance:        
Reference Field:              
Total Observations:      40315
Magnetometor Sensitivity:      1.0 nT
Bounding Limits:
Top Latitude   : +50
Bottom Latitude: +47
Left Longitude : -128
Right Longitude: -124
                                                                             
Altitude Field set equal to 500.                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
                                                                              
