Figure 104: et0 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 105: et1 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 106: et2 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 107: et3 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 108: et4 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 109: es1 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 110: es2 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 111: es4 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 112: es5 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 113: es6 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 114: es7 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 115: es9 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 116: es10 l302 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 117: es1 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 118: es2 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 119: es4 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 120: es5 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 121: es6 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 122: es7 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 123: es9 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.

Figure 124: es10 l303 combine: The plots show the distributions of means of fitted centroids from Combine runs as a function of time (in sec) for 4 CCDs.