DIRC Video Meeting

David Brown 9-3-97

DIRC Online Status (DAQ)

BaBar online system developing rapidly

Focus group meeting helped identify problem areas

Successful working group meetings have made substantial progress on these areas

Dataflow delays come from hardware + serialization

Calibration software released with DIRC as the model system

T0�s and Pedestals defined as first calibration types

Offline proxys could already use these in recon

Front-end access program (test panel) via dataflow under development

Gerard Oxoby studying existing panel, designing GUI

Ian Adams working with dataflow group to understand ROM hardware and software

DAQ development stand planned for LBL

ROM will arrive ~1 Dec. (my personsal guesstimate)

DFB + DCC + DIRC crate will arrive ~ Dec. (1st?)

Visitors welcome!