*****************************************************************************
*                                                                           *
*   The plot examples from (E) to (H) demonstrate the use of a Plot File    *
*   and Viewing Loop after this custom summary plot of Geotail/LEP key      *
*   parameters was created and saved into a Plot File.   To retrieve this   *
*   plot,  click Plot File to open this saved Plot File and then selected   *
*   the desired file.  To view more data file, just click 'Plot Control'    *
*   -> 'View Another File'.                                                 *
*                                                                           *
*****************************************************************************

                   [  Help : How to make this plot?  ]


(1) Select data: Click  "Select Data" -> "New" on the menu bar.
                 Select "non-image data" and  8 panels.
                 Click each panel number, then "Select CDF/Key Parameter".
                 Click "OK => Go Plot" to make a plot in default settings.

(2) Customize the plot:

    Click "Plot Control" on the main menu bar and then "Change Plot Settings".
    Select :
    1. "Overall Plot Settings" to change overall font size, etc.

    2. "Panel Layout and Positions" to change the panel locations.  
       First, change x coordinate values of all panels and then each y
       coordinate values.  A user can add a window grid on the top of the
       display window to locate the desired positions.

       Note:  When the plot was first created, it looked pretty odd and plot
              panel looked like a line rather than a box.  This is not a
              problem.  There are many ways to correct this.  To make default
              plotting nicer, a user can adjust the plot margins or display
              window size before making plots.  Or, simply, adjust the panel
              positions after the first plot.
      
    3. "Axis Settings" -> "Axes: X, Y, and Z (color bar)" to change the X
       axis settings.  Erase X-axis labels and click not to annotate these
       X-axes for the panels from 1 to 7.  Change Z-Axis (Color bar) labels.


(3) Click "Plot Control" -> "Save" -> "GIF File" to save as GIF file.

(4) Click "Plot Control" -> "Create/Update a Plot File" to create a plot file
    for reuse.
