Figure 63: et1 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 64: et2 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 65: et3 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 66: et4 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 67: es1 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 68: es2 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 69: es4 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 70: es5 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 71: es6 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 72: es7 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 73: es9 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 74: es10 l302 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 75: es1 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 76: es2 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 77: es4 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 78: es5 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 79: es6 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 80: es7 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 81: es9 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 82: es10 l303 july: The plots show the distributions of means of fitted centroids from July runs as a function of time (in sec) for 4 CCDs.

Figure 83: et0 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 84: et1 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 85: et2 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 86: et3 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 87: et4 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 88: es1 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 89: es2 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 90: es4 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 91: es5 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 92: es6 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 93: es7 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 94: es9 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 95: es10 l302 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 96: es1 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 97: es2 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 98: es4 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 99: es5 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 100: es6 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 101: es7 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 102: es9 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.

Figure 103: es10 l303 sept: The plots show the distributions of means of fitted centroids from Sept runs as a function of time (in sec) for 4 CCDs.