0

500 1000

2000

3000

4000

5000

6000

8000

10000

12000

16000

20000

24000

28000

32000

36000

40000

44000

48000

52000

56000

60000

100

A=62

NDS 60, 337(1990)

Evaluator: M.M. King

62 23V

Q_{β−}(16200)

(2700) Sn

(15600) Sp

62 24Cr

Q_{β−}7300

0+

6500 Sn

(18100) Sp

62 25Mn

Q_{β−}10400

(3+) 0.88 s β−

4800 Sn

13000 Sp

62 26Fe

Q_{β−}2530

0+ 68 s β−

8052 Sn

14500 Sp

62 27Co

Q_{β−}5315

0 2+ 1.50 m β−

22 5+ 13.91 m β−^{~100%}

IT<1%

6604 Sn 9800 Sp

62 28Ni 0+

10597.2 Sn 11136.6 Sp

62 29Cu

Q_{EC}3948

1+ 9.74 m EC

5867 Sp

8886 Sn

62 30Zn

Q_{EC}1627

0+ 9.186 h EC

6477 Sp

12896 Sn

62 31Ga

Q_{EC}9170

0+ 116.12 ms EC

2940 Sp

(12720) Sn 62 32Ge

Q_{EC}(9750)

0+ (2180) Sp

(16600) Sn 62 33As

Q_{EC}(17300) Q_p(1500)

(15000) Sn